﻿<template>
	<div class="mesQiInspTempItem-container">
<!--		<el-card shadow="hover" :body-style="{ padding: '20px 20px 16px 10px', display: 'flex', width: '100%', height: '100%', alignItems: 'start' }">-->
<!--			<el-form :model="state.queryParams" ref="queryForm" :show-message="false" :inlineMessage="true" label-width="auto" style="flex: 1 1 0%" @submit.prevent="handleQuery" >-->
<!--				<el-row :gutter="10">-->
<!--					<el-col :xs="24" :sm="12" :md="8" :lg="6" :xl="6" class="mb5">-->
<!--						<el-form-item label="关键字" prop="searchKey">-->
<!--							<el-input v-model="state.queryParams.searchKey" placeholder="请输入模糊查询关键字" clearable @keyup.enter.native="handleQuery" />-->
<!--						</el-form-item>-->
<!--					</el-col>-->
<!--					<el-col :xs="24" :sm="12" :md="8" :lg="6" :xl="6" class="mb5" v-if="state.showAdvanceQueryUI">-->
<!--						<el-form-item label="工序检验项模板id" prop="qiInspTempId">-->
<!--							<el-input v-model="state.queryParams.qiInspTempId" placeholder="工序检验项模板id" clearable @keyup.enter.native="handleQuery" />-->
<!--						</el-form-item>-->
<!--					</el-col>-->
<!--					<el-col :xs="24" :sm="12" :md="8" :lg="6" :xl="6" class="mb5" v-if="state.showAdvanceQueryUI">-->
<!--						<el-form-item label="检验项编码">-->
<!--							<el-select filterable="" v-model="state.queryParams.qiItemCode" placeholder="请选择检验项编码" clearable>-->
<!--								<el-option v-for="(item,index) in mesQiItemQiItemCodeDropdownList" :key="index" :value="item.value" :label="item.label" />-->
<!--							</el-select>-->
<!--						</el-form-item>-->
<!--					</el-col>-->
<!--					<el-col :xs="24" :sm="12" :md="8" :lg="6" :xl="6" class="mb5" v-if="state.showAdvanceQueryUI">-->
<!--						<el-form-item label="标准值">-->
<!--							<el-input-number v-model="state.queryParams.standVal" placeholder="请输入标准值" clearable @keyup.enter.native="handleQuery" />-->
<!--					</el-form-item>-->
<!--					</el-col>-->
<!--					<el-col :xs="24" :sm="12" :md="8" :lg="6" :xl="6" class="mb5" v-if="state.showAdvanceQueryUI">-->
<!--						<el-form-item label="上限值">-->
<!--							<el-input-number v-model="state.queryParams.maxVal" placeholder="请输入上限值" clearable @keyup.enter.native="handleQuery" />-->
<!--					</el-form-item>-->
<!--					</el-col>-->
<!--					<el-col :xs="24" :sm="12" :md="8" :lg="6" :xl="6" class="mb5" v-if="state.showAdvanceQueryUI">-->
<!--						<el-form-item label="下限值">-->
<!--							<el-input-number v-model="state.queryParams.minVal" placeholder="请输入下限值" clearable @keyup.enter.native="handleQuery" />-->
<!--					</el-form-item>-->
<!--					</el-col>-->
<!--					<el-col :xs="24" :sm="12" :md="8" :lg="6" :xl="6" class="mb5" v-if="state.showAdvanceQueryUI">-->
<!--						<el-form-item label="排序">-->
<!--							<el-input-number v-model="state.queryParams.sorts" placeholder="请输入排序" clearable @keyup.enter.native="handleQuery" />-->
<!--					</el-form-item>-->
<!--					</el-col>-->
<!--					<el-col :xs="24" :sm="12" :md="8" :lg="6" :xl="6" class="mb5" v-if="state.showAdvanceQueryUI">-->
<!--						<el-form-item label="默认结论填充项" prop="defaultResult">-->
<!--							<el-input v-model="state.queryParams.defaultResult" placeholder="默认结论填充项" clearable @keyup.enter.native="handleQuery" />-->
<!--						</el-form-item>-->
<!--					</el-col>-->
<!--				</el-row>-->
<!--			</el-form>-->

<!--			<el-divider style="height: calc(100% - 5px); margin: 0 10px" direction="vertical" />-->

<!--			<el-row>-->
<!--				<el-col>-->
<!--					<el-button-group>-->
<!--						<el-button type="primary" icon="ele-Search" @click="handleQuery" v-auth="'mesQiInspTempItem/page'" :loading="options.loading"> 查询 </el-button>-->
<!--						<el-button icon="ele-Refresh" @click="resetQuery" :loading="options.loading"> 重置 </el-button>-->
<!--						<el-button icon="ele-ZoomIn" @click="changeAdvanceQueryUI" v-if="!state.showAdvanceQueryUI" style="margin-left: 5px"> 高级查询 </el-button>-->
<!--						<el-button icon="ele-ZoomOut" @click="changeAdvanceQueryUI" v-if="state.showAdvanceQueryUI" style="margin-left: 5px"> 隐藏 </el-button>-->
<!--					</el-button-group>-->
<!--				</el-col>-->
<!--			</el-row>-->
<!--		</el-card>-->

		<el-card class="full-table" shadow="hover" style="margin-top: 5px">
			<vxe-grid ref="xGrid" class="xGrid-style" v-bind="options" v-on="gridEvents">
				<template #toolbar_buttons>
					<el-button type="primary" icon="ele-Plus" @click="handleAdd" v-auth="'mesQiInspTempItem/add'"> 新增 </el-button>
				</template>
				<template #toolbar_tools> </template>
				<template #empty>
					<el-empty :image-size="200" />
				</template>
				<template #row_qiItemCode="{ row }">
					<span>{{ row.qiItemCodeItemName }}</span>
				</template>
				<template #row_isMust="{ row }">
					<el-tag v-if="row.isMust"> 是 </el-tag>
					<el-tag type="danger" v-else> 否 </el-tag>
				</template>
				<template #row_isFirst="{ row }">
					<el-tag v-if="row.isFirst"> 是 </el-tag>
					<el-tag type="danger" v-else> 否 </el-tag>
				</template>
				<template #row_isLast="{ row }">
					<el-tag v-if="row.isLast"> 是 </el-tag>
					<el-tag type="danger" v-else> 否 </el-tag>
				</template>
				<template #row_isSelf="{ row }">
					<el-tag v-if="row.isSelf"> 是 </el-tag>
					<el-tag type="danger" v-else> 否 </el-tag>
				</template>
				<template #row_isXj="{ row }">
					<el-tag v-if="row.isXj"> 是 </el-tag>
					<el-tag type="danger" v-else> 否 </el-tag>
				</template>
				<template #row_record="{ row }">
					<ModifyRecord :data="row" />
				</template>
				<template #row_buttons="{ row }">
					<el-tooltip content="编辑" placement="top">
						<el-button icon="ele-Edit" size="small" text type="primary" @click="handleEdit(row)" v-auth="'mesQiInspTempItem/update'" />
					</el-tooltip>
					<el-tooltip content="删除" placement="top">
						<el-button icon="ele-Delete" size="small" text type="danger" @click="handleDelete(row)" v-auth="'mesQiInspTempItem/delete'" />
					</el-tooltip>
				</template>
			</vxe-grid>
		</el-card>

		<PrintDialog ref="printDialogRef" :title="state.title" @reloadTable="handleQuery" />
		<EditDialog ref="editDialogRef" :title="state.title" @reloadTable="handleQuery" />
	</div>
</template>

<script lang="ts" setup name="mesQiInspTempItem">
import { onMounted, reactive, ref } from 'vue';
import { ElMessageBox, ElMessage } from "element-plus";
import { auth } from '/@/utils/authFunction';

import { VxeGridInstance, VxeGridListeners, VxeGridPropTypes } from 'vxe-table';
import { useVxeTable } from '/@/hooks/useVxeTableOptionsHook';
import { Local } from '/@/utils/storage';

import { formatDate } from '/@/utils/formatTime';

// 子窗口
import PrintDialog from '/@/views/system/print/component/hiprint/preview.vue';
import EditDialog from '/@/views/mes/mesQiInspTempItem/component/editDialog.vue';
import ModifyRecord from '/@/components/table/modifyRecord.vue';

import { pageMesQiInspTempItem, deleteMesQiInspTempItem } from '/@/api/mes/mesQiInspTempItem';
	import { getMesQiItemQiItemCodeDropdown } from '/@/api/mes/mesQiInspTempItem';

// 子窗口对象
const xGrid = ref<VxeGridInstance>();
const printDialogRef = ref<InstanceType<typeof PrintDialog>>();
const editDialogRef = ref<InstanceType<typeof EditDialog>>();

// 变量
const state = reactive({
	showAdvanceQueryUI: false,
	queryParams: {
		searchKey: undefined,
		qiInspTempId: undefined,
		qiItemCode: undefined,
		standVal: undefined,
		maxVal: undefined,
		minVal: undefined,
		sorts: undefined,
		isMust: undefined,
		defaultResult: undefined,
		isFirst: undefined,
		isLast: undefined,
		isSelf: undefined,
		isXj: undefined,
	},
	localPageParam: {
		pageSize: 50 as number,
		defaultSort: { field: 'id', order: 'desc', descStr: 'desc' },
	},
	visible: false,
	title: '',
});

// 本地存储参数
const localPageParamKey = 'localPageParam:mesQiInspTempItem';
//父级传递来的参数
var props = defineProps({
  qiInspTempId: {
    type: String,
    default: "",
  },
});
// 改变高级查询的控件显示状态
const changeAdvanceQueryUI = () => {
	state.showAdvanceQueryUI = !state.showAdvanceQueryUI;
};

// 表格参数配置
const options = useVxeTable<any>(
	{
		id: 'MesQiInspTempItem',
		name: '工序检验模板检验项',
		columns: [
			{ type: 'seq', title: '序号', width: 60, fixed: 'left' },
			// { field: 'qiInspTempId', title: '工序检验项模板id', minWidth: 100, showOverflow: 'tooltip', sortable: false},
			{ field: 'qiItemCode', title: '检验项', minWidth: 100, showOverflow: 'tooltip', slots: { default: 'row_qiItemCode' }, sortable: false },
			{ field: 'standVal', title: '标准值', minWidth: 100, showOverflow: 'tooltip', sortable: false},
			{ field: 'maxVal', title: '上限值', minWidth: 100, showOverflow: 'tooltip', sortable: false},
			{ field: 'minVal', title: '下限值', minWidth: 100, showOverflow: 'tooltip', sortable: false},
			{ field: 'sorts', title: '排序', minWidth: 100, showOverflow: 'tooltip', sortable: false},
			{ field: 'isMust', title: '必填', minWidth: 100, showOverflow: 'tooltip', slots: { default: 'row_isMust' }, sortable: false },
			{ field: 'defaultResult', title: '默认结论填充项', minWidth: 100, showOverflow: 'tooltip', sortable: false},
			{ field: 'inspStand', title: '检验标准', minWidth: 100, showOverflow: 'tooltip', sortable: false},
			// { field: 'isFirst', title: '是否首检', minWidth: 100, showOverflow: 'tooltip', slots: { default: 'row_isFirst' }, sortable: false },
			// { field: 'isLast', title: '是否末检', minWidth: 100, showOverflow: 'tooltip', slots: { default: 'row_isLast' }, sortable: false },
			// { field: 'isSelf', title: '是否自检', minWidth: 100, showOverflow: 'tooltip', slots: { default: 'row_isSelf' }, sortable: false },
			// { field: 'isXj', title: '是否巡检', minWidth: 100, showOverflow: 'tooltip', slots: { default: 'row_isXj' }, sortable: false },
			{ title: '修改记录', width: 100, showOverflow: 'tooltip', slots: { default: 'row_record' } },
			{ title: '操作', fixed: 'right', width: 120, showOverflow: true, slots: { default: 'row_buttons' } },
		],
	},
	// vxeGrid配置参数(此处可覆写任何参数)，参考vxe-table官方文档
	{
    height:"400px",
		// 代理配置
		proxyConfig: { autoLoad: true, ajax: { query: ({ page, sort }) => handleQueryApi(page, sort) } },
		// 排序配置
		sortConfig: { defaultSort: Local.get(localPageParamKey)?.defaultSort || state.localPageParam.defaultSort },
		// 分页配置
		pagerConfig: { pageSize: Local.get(localPageParamKey)?.pageSize || state.localPageParam.pageSize },
		// 工具栏配置
		toolbarConfig: { export: false },
		// 行设置
		// rowConfig: { height: 80 },
	}
);

// 页面初始化
onMounted(() => {});

// 查询api
const handleQueryApi = async (page: VxeGridPropTypes.ProxyAjaxQueryPageParams, sort: VxeGridPropTypes.ProxyAjaxQuerySortCheckedParams) => {
	const params = Object.assign(state.queryParams, { page: page.currentPage, pageSize: page.pageSize, field: sort.field, order: sort.order, descStr: 'desc' }) as any;
  params.qiInspTempId = props.qiInspTempId;
  return pageMesQiInspTempItem(params);
};

// 查询操作
const handleQuery = async (reset = false) => {
	options.loading = true;
	await xGrid.value?.commitProxy('query');
	options.loading = false;
};

// 重置操作
const resetQuery = async () => {
	state.queryParams.searchKey = undefined,
	state.queryParams.qiInspTempId = undefined,
	state.queryParams.qiItemCode = undefined,
	state.queryParams.standVal = undefined,
	state.queryParams.maxVal = undefined,
	state.queryParams.minVal = undefined,
	state.queryParams.sorts = undefined,
	state.queryParams.isMust = undefined,
	state.queryParams.defaultResult = undefined,
	state.queryParams.isFirst = undefined,
	state.queryParams.isLast = undefined,
	state.queryParams.isSelf = undefined,
	state.queryParams.isXj = undefined,
	await xGrid.value?.commitProxy('reload');
};

// 打开新增页面
const handleAdd = () => {
	state.title = '添加工序检验模板检验项';
	editDialogRef.value?.openDialog({
    qiInspTempId:props.qiInspTempId
  });
};

// 打开编辑页面
const handleEdit = (row: any) => {
	state.title = '编辑工序检验模板检验项';
	editDialogRef.value?.openDialog(row);
};

// 打开打印页面
const handlePrint = async (row: any) => {
	state.title = '打印工序检验模板检验项';
};

// 删除
const handleDelete = (row: any) => {
	ElMessageBox.confirm(`确定删除工序检验模板检验项?`, '提示', {
		confirmButtonText: '确定',
		cancelButtonText: '取消',
		type: 'warning',
	}).then(async () => {
		await deleteMesQiInspTempItem(row);
		await handleQuery();
		ElMessage.success('删除成功');
	})
	.catch(() => {});
};

// 表格事件
const gridEvents: VxeGridListeners<any> = {
	// 只对 pager-config 配置时有效，分页发生改变时会触发该事件
	async pageChange({ pageSize }) {
		state.localPageParam.pageSize = pageSize;
		Local.set(localPageParamKey, state.localPageParam);
	},
	// 当排序条件发生变化时会触发该事件
	async sortChange({ field, order }) {
		state.localPageParam.defaultSort = { field: field, order: order!, descStr: 'desc' };
		Local.set(localPageParamKey, state.localPageParam);
	},
};

const mesQiItemQiItemCodeDropdownList = ref<any>([]);
const getMesQiItemQiItemCodeDropdownList = async () => {
		let list = await getMesQiItemQiItemCodeDropdown();
	mesQiItemQiItemCodeDropdownList.value = list.data.result ?? [];
};
getMesQiItemQiItemCodeDropdownList();
</script>

<style lang="scss" scoped>
:deep(.el-input),
:deep(.el-select),
:deep(.el-input-number) {
	width: 100%;
}
</style>
