<template>
  <svg style="transform: scale(0.85)" viewBox="0 0 512 512">
    <path
      d="M0 64C0 46.3 14.3 32 32 32H480c17.7 0 32 14.3 32 32s-14.3 32-32 32V416c17.7 0 32 14.3 32 32s-14.3 32-32 32H32c-17.7 0-32-14.3-32-32s14.3-32 32-32V96C14.3 96 0 81.7 0 64zM256 96c-8.8 0-16 7.2-16 16v32H160c-8.8 0-16 7.2-16 16s7.2 16 16 16h80v48H128c-8.8 0-16 7.2-16 16s7.2 16 16 16H240v70.6L189.1 307c-5.2-2-10.6-3-16.2-3h-2.1c-23.6 0-42.8 19.2-42.8 42.8c0 9.6 3.2 18.9 9.1 26.4l18.2 23.2c9.7 12.4 24.6 19.6 40.3 19.6H316.4c15.7 0 30.6-7.2 40.3-19.6l18.2-23.2c5.9-7.5 9.1-16.8 9.1-26.4c0-23.6-19.2-42.8-42.8-42.8H339c-5.5 0-11 1-16.2 3L272 326.6V256H384c8.8 0 16-7.2 16-16s-7.2-16-16-16H272V176h80c8.8 0 16-7.2 16-16s-7.2-16-16-16H272V112c0-8.8-7.2-16-16-16zM208 352a16 16 0 1 1 0 32 16 16 0 1 1 0-32zm80 16a16 16 0 1 1 32 0 16 16 0 1 1 -32 0z"
    />
  </svg>
</template>
<script lang="ts">
import { defineComponent, markRaw } from 'vue'
export default defineComponent(markRaw({ name: 'XRay' }))
</script>
