<template>
  <svg style="transform: scale(0.85)" viewBox="0 0 512 512">
    <path
      d="M0 64C0 46.3 14.3 32 32 32H88h48 56c17.7 0 32 14.3 32 32s-14.3 32-32 32V400c0 44.2-35.8 80-80 80s-80-35.8-80-80V96C14.3 96 0 81.7 0 64zM136 96H88V256h48V96zM288 64c0-17.7 14.3-32 32-32h56 48 56c17.7 0 32 14.3 32 32s-14.3 32-32 32V400c0 44.2-35.8 80-80 80s-80-35.8-80-80V96c-17.7 0-32-14.3-32-32zM424 96H376V256h48V96z"
    />
  </svg>
</template>
<script lang="ts">
import { defineComponent, markRaw } from 'vue'
export default defineComponent(markRaw({ name: 'Vials' }))
</script>
