<template>
  <svg style="transform: scale(0.85)" viewBox="0 0 512 512">
    <path
      d="M0 64C0 46.3 14.3 32 32 32H96h64 64c17.7 0 32 14.3 32 32s-14.3 32-32 32V266.8c-20.2 28.6-32 63.5-32 101.2c0 25.2 5.3 49.1 14.8 70.8C189.5 463.7 160.6 480 128 480c-53 0-96-43-96-96V96C14.3 96 0 81.7 0 64zM96 96v96h64V96H96zM224 368a144 144 0 1 1 288 0 144 144 0 1 1 -288 0zm211.3-43.3c-6.2-6.2-16.4-6.2-22.6 0L352 385.4l-28.7-28.7c-6.2-6.2-16.4-6.2-22.6 0s-6.2 16.4 0 22.6l40 40c6.2 6.2 16.4 6.2 22.6 0l72-72c6.2-6.2 6.2-16.4 0-22.6z"
    />
  </svg>
</template>
<script lang="ts">
import { defineComponent, markRaw } from 'vue'
export default defineComponent(markRaw({ name: 'VialCircleCheck' }))
</script>
