<template>
  <svg style="transform: scale(0.85)" viewBox="0 0 512 512">
    <path
      d="M96 382.1V293.3c0-14.9 5.9-29.1 16.4-39.6l27.3-27.3 57 57c6.2 6.2 16.4 6.2 22.6 0s6.2-16.4 0-22.6l-57-57 41.4-41.4 57 57c6.2 6.2 16.4 6.2 22.6 0s6.2-16.4 0-22.6l-57-57 41.4-41.4 57 57c6.2 6.2 16.4 6.2 22.6 0s6.2-16.4 0-22.6l-57-57 45.5-45.5C355.2 10.9 381.4 0 408.8 0C465.8 0 512 46.2 512 103.2c0 27.4-10.9 53.6-30.2 73L258.3 399.6c-10.5 10.5-24.7 16.4-39.6 16.4H129.9L41 505c-9.4 9.4-24.6 9.4-33.9 0s-9.4-24.6 0-33.9l89-89z"
    />
  </svg>
</template>
<script lang="ts">
import { defineComponent, markRaw } from 'vue'
export default defineComponent(markRaw({ name: 'Thermometer' }))
</script>
