<template>
  <svg style="transform: scale(0.85)" viewBox="0 0 512 512">
    <path
      d="M216 186.7c-23.9 13.8-40 39.7-40 69.3L32 256C14.3 256-.2 241.6 2 224.1C10.7 154 47.8 92.7 101.3 52c14.1-10.7 33.8-5.3 42.7 10l72 124.7zM256 336c14.6 0 28.2-3.9 40-10.7l72 124.8c8.8 15.3 3.7 35.1-12.6 41.9c-30.6 12.9-64.2 20-99.4 20s-68.9-7.1-99.4-20c-16.3-6.9-21.4-26.6-12.6-41.9l72-124.8c11.8 6.8 25.4 10.7 40 10.7zm224-80l-144 0c0-29.6-16.1-55.5-40-69.3L368 62c8.8-15.3 28.6-20.7 42.7-10c53.6 40.7 90.6 102 99.4 172.1c2.2 17.5-12.4 31.9-30 31.9zM256 208a48 48 0 1 1 0 96 48 48 0 1 1 0-96z"
    />
  </svg>
</template>
<script lang="ts">
import { defineComponent, markRaw } from 'vue'
export default defineComponent(markRaw({ name: 'Radiation' }))
</script>
