<template>
  <svg style="transform: scale(0.85)" viewBox="0 0 512 512">
    <path
      d="M96 352V96c0-35.3 28.7-64 64-64H416c35.3 0 64 28.7 64 64V293.5c0 17-6.7 33.3-18.7 45.3l-58.5 58.5c-12 12-28.3 18.7-45.3 18.7H160c-35.3 0-64-28.7-64-64zM272 128c-8.8 0-16 7.2-16 16v48H208c-8.8 0-16 7.2-16 16v32c0 8.8 7.2 16 16 16h48v48c0 8.8 7.2 16 16 16h32c8.8 0 16-7.2 16-16V256h48c8.8 0 16-7.2 16-16V208c0-8.8-7.2-16-16-16H320V144c0-8.8-7.2-16-16-16H272zm24 336c13.3 0 24 10.7 24 24s-10.7 24-24 24H136C60.9 512 0 451.1 0 376V152c0-13.3 10.7-24 24-24s24 10.7 24 24l0 224c0 48.6 39.4 88 88 88H296z"
    />
  </svg>
</template>
<script lang="ts">
import { defineComponent, markRaw } from 'vue'
export default defineComponent(markRaw({ name: 'NotesMedical' }))
</script>
