<template>
  <svg style="transform: scale(0.85)" viewBox="0 0 384 512">
    <path
      d="M302.1 42.8c5.9-16.6-2.7-35-19.4-40.9s-35 2.7-40.9 19.4L208 116.1c-5.7 4-11.1 8.5-16 13.5C171.7 108.9 143.3 96 112 96c-19.5 0-37.8 5-53.7 13.7C52.5 101.4 42.9 96 32 96C14.3 96 0 110.3 0 128v80V416c0 17.7 14.3 32 32 32s32-14.3 32-32V208c0-26.5 21.5-48 48-48s48 21.5 48 48v42.5L81.9 469.2c-5.9 16.6 2.7 35 19.4 40.9s35-2.7 40.9-19.4l21.4-60C168.9 441 179.6 448 192 448c17.7 0 32-14.3 32-32V261.5l35.7-100c3.9-1 8.1-1.6 12.3-1.6c26.5 0 48 21.5 48 48V416c0 17.7 14.3 32 32 32s32-14.3 32-32V208c0-58.2-44.3-106-101.1-111.5l19.2-53.8z"
    />
  </svg>
</template>
<script lang="ts">
import { defineComponent, markRaw } from 'vue'
export default defineComponent(markRaw({ name: 'MillSign' }))
</script>
