<template>
  <svg style="transform: scale(0.85)" viewBox="0 0 512 512">
    <path
      d="M0 256a256 256 0 1 1 512 0A256 256 0 1 1 0 256zm320 96c0-26.9-16.5-49.9-40-59.3V88c0-13.3-10.7-24-24-24s-24 10.7-24 24V292.7c-23.5 9.5-40 32.5-40 59.3c0 35.3 28.7 64 64 64s64-28.7 64-64z"
    />
  </svg>
</template>
<script lang="ts">
import { defineComponent, markRaw } from 'vue'
export default defineComponent(markRaw({ name: 'GaugeSimple' }))
</script>
