<template>
  <svg style="transform: scale(0.85)" viewBox="0 0 512 512">
    <path
      d="M0 256a256 256 0 1 1 512 0A256 256 0 1 1 0 256zm320 96c0-15.9-5.8-30.4-15.3-41.6l76.6-147.4c6.1-11.8 1.5-26.3-10.2-32.4s-26.2-1.5-32.4 10.2L262.1 288.3c-2-.2-4-.3-6.1-.3c-35.3 0-64 28.7-64 64s28.7 64 64 64s64-28.7 64-64z"
    />
  </svg>
</template>
<script lang="ts">
import { defineComponent, markRaw } from 'vue'
export default defineComponent(markRaw({ name: 'GaugeSimpleHigh' }))
</script>
