<template>
  <svg style="transform: scale(0.85)" viewBox="0 0 640 512">
    <path
      d="M0 96a64 64 0 1 1 128 0A64 64 0 1 1 0 96zM224 272a16 16 0 1 0 0-32 16 16 0 1 0 0 32zm0-80a64 64 0 1 1 0 128 64 64 0 1 1 0-128zM80 416a16 16 0 1 0 -32 0 16 16 0 1 0 32 0zM0 416a64 64 0 1 1 128 0A64 64 0 1 1 0 416zm240 0a16 16 0 1 0 -32 0 16 16 0 1 0 32 0zm-80 0a64 64 0 1 1 128 0 64 64 0 1 1 -128 0zM64 192a64 64 0 1 1 0 128 64 64 0 1 1 0-128zM224 32a64 64 0 1 1 0 128 64 64 0 1 1 0-128zM352 96a64 64 0 1 1 128 0A64 64 0 1 1 352 96zm240 0a16 16 0 1 0 -32 0 16 16 0 1 0 32 0zm-80 0a64 64 0 1 1 128 0A64 64 0 1 1 512 96zm64 176a16 16 0 1 0 0-32 16 16 0 1 0 0 32zm0-80a64 64 0 1 1 0 128 64 64 0 1 1 0-128zm16 224a16 16 0 1 0 -32 0 16 16 0 1 0 32 0zm-80 0a64 64 0 1 1 128 0 64 64 0 1 1 -128 0zM416 272a16 16 0 1 0 0-32 16 16 0 1 0 0 32zm0-80a64 64 0 1 1 0 128 64 64 0 1 1 0-128zm16 224a16 16 0 1 0 -32 0 16 16 0 1 0 32 0zm-80 0a64 64 0 1 1 128 0 64 64 0 1 1 -128 0z"
    />
  </svg>
</template>
<script lang="ts">
import { defineComponent, markRaw } from 'vue'
export default defineComponent(markRaw({ name: 'Braille' }))
</script>
