<template>
  <svg style="transform: scale(0.85)" viewBox="0 0 512 512">
    <path
      d="M92.5 0H208c40 0 52 24 64 48s24 48 64 48h85.2C436 96 448 108 448 122.8c0 3.4-.7 6.8-1.9 10L409.6 224 384 288H128l-16-64L64.9 35.4c-.6-2.3-.9-4.6-.9-6.9C64 12.8 76.8 0 92.5 0zM79 224l16 64H80c-8.8 0-16 7.2-16 16s7.2 16 16 16h48H384h48c8.8 0 16-7.2 16-16s-7.2-16-16-16H418.5l25.6-64H464c26.5 0 48 21.5 48 48V384H0V272c0-26.5 21.5-48 48-48H79zM0 416H512v48c0 26.5-21.5 48-48 48H48c-26.5 0-48-21.5-48-48V416z"
    />
  </svg>
</template>
<script lang="ts">
import { defineComponent, markRaw } from 'vue'
export default defineComponent(markRaw({ name: 'BoxTissue' }))
</script>
