
<template>
    <svg :width="size" :height="size" :stroke-width="weight"  xmlns="http://www.w3.org/2000/svg" viewBox="0 0 24 24"><g id="microscope"><line class="cls-1" x1="6.75" y1="22.5" x2="19.16" y2="22.5"/><path class="cls-1" d="M6.92,17.73a6.2,6.2,0,1,0,8.75-7"/><path class="cls-1" d="M12.16,6.24h1.58a1.91,1.91,0,0,1,1.91,1.91V13a0,0,0,0,1,0,0h-5.4a0,0,0,0,1,0,0V8.15a1.91,1.91,0,0,1,1.91-1.91Z" transform="translate(10.59 -6.34) rotate(45)"/><rect class="cls-1" x="15.32" y="3.19" width="3.37" height="4.72" transform="translate(8.91 -10.4) rotate(45)"/><line class="cls-1" x1="16.3" y1="1.5" x2="21.07" y2="6.27"/><line class="cls-1" x1="2.93" y1="17.73" x2="11.52" y2="17.73"/></g></svg>
</template>
<script>
    export default {
        props: {
            size: {
                type: Number,
                default: 24,
                required: false,
            },
            weight: {
                type: Number,
                default: 2,
                required: false,
            },
        }
    }
</script>
<style scoped>
    .cls-1{fill:none;stroke:currentColor;stroke-miterlimit:10;}
</style>