export default function Home() {
  return (
    <main>
      <h1>Pages Router test app</h1>
      <p>
        Fixture for testing the Redis cache handler with the Next.js Pages
        Router (PAGES, REDIRECT and notFound cache entries).
      </p>
    </main>
  );
}
