import * as React from "react";
import Svg, { G, Path } from "react-native-svg";

type SvgWrapperProps = {
  children: React.ReactNode;
  scale: number;
  side: "front" | "back";
};

export const SvgFemaleWrapper: React.FC<SvgWrapperProps> = ({
  children,
  scale,
  side,
}) => {
  const viewBox = side === "front" ? "-50 -40 734 1538" : "756 0 774 1448";

  return (
    <Svg viewBox={viewBox} height={400 * scale} width={200 * scale}>
      <G strokeWidth={2} fill="none" strokeLinecap="butt">
        {side === "front" && (
          <Path
            stroke="#dfdfdf"
            vectorEffect="non-scaling-stroke"
            d="m 373.53,205.88 c -0.45333,0.42667 -0.81,0.91667 -1.07,1.47 -3.29333,7.06 -7.28,13.70667 -11.96,19.94 -2.14,2.84667 -4.41,5.19333 -6.81,7.04 -0.36158,0.27621 -0.53584,0.73316 -0.45,1.18 0.43333,2.3 0.96,4.58667 1.58,6.86 7,25.46 37.78,29.15 59.68,31.39 6.10667,0.62 12.19667,1.61 18.27,2.97 7.96,1.77333 14.17,3.97667 18.63,6.61 14.63,8.62 23.15,23.99 26.24,40.5 3.70667,19.74 5.03,39.49 3.97,59.25 -0.0526,0.96072 0.11501,1.92175 0.49,2.81 1.62,3.77333 3.20667,7.65 4.76,11.63 6.18,15.8 10.13333,32.57333 11.86,50.32 1.18,12.12 1.68,23.92667 1.5,35.42 -0.02,1.29333 0.40333,2.43333 1.27,3.42 17.89,20.25 33.57,44.36 41.14,69.73 2.5,8.36667 5.17333,17.90333 8.02,28.61 4.34,16.3 12.18,33.04 22.68,47.08 3.98,5.31333 7.70667,10.38667 11.18,15.22 0.59333,0.83333 1.35333,1.58333 2.28,2.25 0.28,0.2 0.59,0.3 0.93,0.3 4.22667,-0.0133 8.26333,1.50667 12.11,4.56 6.02,4.78 12.17,10.11667 18.45,16.01 1.51,1.42 3.29,2.63 5.25,3.29 9.2,3.11 19.48,8.17 17.09,19.99 -0.32,1.61 -1.49,2.31 -3.05,2.48 -4.18667,0.46 -8.50667,-0.5 -12.96,-2.88 -4.75333,-2.53333 -8.58667,-4.99667 -11.5,-7.39 -0.55333,-0.45333 -1.12667,-0.48 -1.72,-0.08 l -0.24,0.16 c -0.30375,0.208 -0.35544,0.63562 -0.11,0.91 5.52667,6.25333 9.60333,12.61667 12.23,19.09 4.1,10.08667 7.07333,20.87333 8.92,32.36 0.56667,3.52 0.71667,7.10333 0.45,10.75 -0.34667,4.75333 -3.07,6.62333 -8.17,5.61 -0.77333,-0.16 -1.02333,0.13 -0.75,0.87 0.75333,2.03333 1.44333,4.07 2.07,6.11 1.56,5.04667 -0.2,8.07 -5.28,9.07 -3.49,0.69 -5.42,-2.17 -7.04,-4.75 -0.35421,-0.55015 -1.1808,-0.475 -1.43,0.13 -1.26667,3.16 -3.75333,4.66 -7.46,4.5 -2.69,-0.11 -4.64,-2.56 -5.81,-4.72 -1.54,-2.84667 -3.06,-5.96667 -4.56,-9.36 -0.72,-1.63333 -1.17,-1.56 -1.35,0.22 -0.04,0.44667 -0.04,0.88667 0,1.32 0.0506,0.45209 -0.0911,0.90266 -0.39,1.24 -6.1,6.88 -17.12,-14.55 -18.83,-18.14 -5.52,-11.58 -10.07333,-23.92333 -13.66,-37.03 -2.86,-10.44 -5.67667,-21.13333 -8.45,-32.08 -1.38,-5.43 -3.45,-10.62 -6.82,-15.28 -15.64,-21.66 -32.51,-41.59 -48.94,-62.08 -10.83333,-13.5 -19.95333,-26.60333 -27.36,-39.31 -4.35333,-7.44667 -7.92667,-14.98 -10.72,-22.6 -2.62,-7.14 -4.03667,-14.75667 -4.25,-22.85 -0.06,-2.17 -1.76,-6 -3.08,-8.08 -1.58667,-2.49333 -2.99,-5.05667 -4.21,-7.69 -7.74667,-16.80667 -13.65,-34.53333 -17.71,-53.18 -1.79333,-8.22 -2.94,-15.92 -3.44,-23.1 -0.02,-0.26 -0.0933,-0.50333 -0.22,-0.73 -0.27333,-0.50667 -0.47333,-0.48 -0.6,0.08 -1.26667,5.63333 -3.42667,10.71333 -6.48,15.24 -1.95,2.89 -4.68,5.3 -7.05,7.94 -1.00667,1.12667 -1.63667,2.41333 -1.89,3.86 -0.28667,1.63333 -0.44,3.18667 -0.46,4.66 -0.32667,32.01333 -1.04333,63.59667 -2.15,94.75 -0.1,2.86 0.11,5.76 0.63,8.7 0.94,5.33 4.48,9.32 7.59,13.42 28.13,37.13 39.68,83.8 42.02,130.13 1.55333,30.82667 0.26333,61.91 -3.87,93.25 -3.72667,28.26 -8.91333,56.45333 -15.56,84.58 -6.84667,28.98667 -14.71333,57.40667 -23.6,85.26 -1.72,5.39333 -3.00667,10.55333 -3.86,15.48 -2.69333,15.53333 -4.80333,30.7733 -6.33,45.72 -0.42667,4.1533 -0.60333,7.9733 -0.53,11.46 0.0667,3.3133 0.56667,6.8767 1.5,10.69 5.34,21.8067 9.62333,42.4733 12.85,62 1.64667,9.9467 2.82333,20.4633 3.53,31.55 1.09333,17.08 -0.91667,33.71 -6.03,49.89 -4.02,12.69 -10.84,31.49 -15.29,47.24 -5.78,20.44 -10.58667,41.91 -14.42,64.41 -0.91333,5.3467 -1.38,10.3533 -1.4,15.02 -0.0267,5.0533 -0.14333,10.22 -0.35,15.5 -0.12,3.09 0.5,6 1.74,8.88 2.88,6.73 5.31,15.28 2.81,22.38 -2.82,8 4.32,16.54 8.4,22.9 3.28,5.1067 5.71,10.0833 7.29,14.93 1.9,5.85 8.39,13.01 13.6,16.02 5.4,3.11 7.35,6.81 7,13.31 -0.24,4.33 -3.01,4.97 -6.62,5.27 -7.24,0.5933 -14.49333,1.0133 -21.76,1.26 h -26.32 c -6.06667,-0.1867 -12.12,-0.4867 -18.16,-0.9 -3.61333,-0.2533 -5.87,-0.5367 -6.77,-0.85 -6.82,-2.36 -6.74,-17.36 -6.44,-23.15 0.40667,-8.0133 1.49333,-15.8467 3.26,-23.5 1.32,-5.74 2.15,-11.64 2.97,-17.44 0.64,-4.61 0.34,-9.01 0.02,-13.63 -0.32667,-4.6333 -0.007,-9.1933 0.96,-13.68 0.27333,-1.26 0.40667,-2.6733 0.4,-4.24 -0.12,-20.3133 -0.66333,-40.95 -1.63,-61.91 -0.51333,-11.08 -1.24333,-21.3933 -2.19,-30.94 -0.24667,-2.4467 -0.48333,-4.12 -0.71,-5.02 -2.64,-10.4267 -4.75,-19.4267 -6.33,-27 -5.83,-28 -8.22,-56.65 -5.12,-86.07 0.81,-7.69 2.63,-17.18 3.77,-25.59 0.82,-6.0933 1.79667,-12.4767 2.93,-19.15 1.72667,-10.1533 2.95333,-19.9667 3.68,-29.44 0.24667,-3.2667 0.18667,-7.8433 -0.18,-13.73 -0.8,-12.77 -0.72,-25.5 -0.94,-38.64 -0.08,-4.77 0.66,-9.26 -0.1,-14.08 -1.01,-6.35 -1.99,-12.68 -2.63,-19.09 -1.76,-17.5 -3.09333,-31.96333 -4,-43.39 -2.92,-36.9 -4.94333,-71.84333 -6.07,-104.83 -0.62,-18.13333 -0.83,-32.25333 -0.63,-42.36 0.23,-11.76 0.52,-22.64 2.96,-33.39 0.3,-1.31 1.07,-2.44 1.58,-3.7 0.21633,-0.51724 -0.21543,-1.07235 -0.77,-0.99 -5.92,0.89333 -11.68667,0.89 -17.3,-0.01 -0.50066,-0.0855 -0.88038,0.44258 -0.64,0.89 1.22,2.32667 2.01,4.64 2.37,6.94 0.99333,6.25333 1.60667,12.63 1.84,19.13 0.87,24.2 0.11,49.22 -1.04,73.76 -1.77333,37.8 -4.43667,76.32667 -7.99,115.58 -0.87333,9.67333 -2.03333,19.13333 -3.48,28.38 -0.55333,3.52667 -0.79667,7.11333 -0.73,10.76 0.2,11.4933 0.0733,23.2633 -0.38,35.31 -0.37,9.95 -1.13,19.25 -0.15,28.95 0.70667,7.04 1.66,14.1833 2.86,21.43 1.86,11.23 3.05,20.33 4.64,30.47 1.44,9.1533 2.34667,15.75 2.72,19.79 1.86,19.88 1.4,39.8167 -1.38,59.81 -2,14.42 -4.83333,28.62 -8.5,42.6 -1.35333,5.1667 -2.25667,9.95 -2.71,14.35 -0.58,5.6133 -1.02,11.07 -1.32,16.37 -1.40667,25.2467 -2.17333,50.6367 -2.3,76.17 -0.007,1.0667 0.1,2.0967 0.32,3.09 0.94,4.1867 1.30667,7.6833 1.1,10.49 -0.4,5.5 -0.49667,10.37 -0.29,14.61 0.18,3.78 1.45333,11.2467 3.82,22.4 2.32,10.94 3.14,21.2167 2.46,30.83 -0.23,3.23 -0.99,6.23 -2.37,9.18 -1.12,2.4067 -3.07,3.7633 -5.85,4.07 -6.41333,0.72 -12.86333,1.1733 -19.35,1.36 h -32.5 c -6.38667,-0.3133 -12.76333,-0.75 -19.13,-1.31 -2.99,-0.26 -5.8,-0.23 -6.38,-3.95 -0.89,-5.79 0.46,-11.19 5.65,-14.03 3.87333,-2.1133 7.71,-5.6967 11.51,-10.75 1.39333,-1.8467 2.39,-3.6933 2.99,-5.54 2.15,-6.58 6.15,-14.18 10.8,-20.3 3.01333,-3.9733 4.75333,-8.46 5.22,-13.46 0.14667,-1.5867 -0.03,-3.33 -0.53,-5.23 -2.08,-7.87 0.88,-16.6 4.1,-23.94 0.75,-1.74 0.92,-4.92 0.84,-6.79 -0.22,-5.6333 -0.35667,-11.2933 -0.41,-16.98 -0.0333,-4.0267 -0.50667,-8.5367 -1.42,-13.53 -4.55,-24.93 -9.62,-49.15 -17.21,-73.21 -3.40667,-10.7933 -7.04667,-21.86 -10.92,-33.2 -6.66667,-19.4867 -9.09333,-39.4767 -7.28,-59.97 1.06667,-11.9667 2.67667,-23.9133 4.83,-35.84 3.06667,-17.02 6.78333,-34.3733 11.15,-52.06 1.02,-4.14 1.58,-7.7567 1.68,-10.85 0.11333,-3.6133 -0.0567,-7.4867 -0.51,-11.62 -1.76667,-16.2533 -4.03333,-32.40667 -6.8,-48.46 -0.41333,-2.42 -0.96667,-4.71 -1.66,-6.87 -9.93333,-30.95333 -19.14,-64.33 -27.62,-100.13 -1.60667,-6.76 -3.05667,-13.43 -4.35,-20.01 -3.02667,-15.4 -5.79667,-32.35667 -8.31,-50.87 -4.47333,-32.97333 -6.08,-64.13333 -4.82,-93.48 1.96,-45.94 12.04,-90.97 37.47,-128.29 2.24,-3.3 4.7,-6.4 7.12,-9.46 4.15,-5.26 5.95,-10.32 5.77,-16.87 -0.93333,-32.91333 -1.63667,-65.25667 -2.11,-97.03 -0.03,-1.94 -0.52,-3.58 -0.98,-5.42 -0.33333,-1.32 -0.91,-2.49333 -1.73,-3.52 -2.11,-2.64 -4.96,-4.81 -6.7,-7.55 -2.83333,-4.43333 -4.92333,-9.26 -6.27,-14.48 -0.44667,-1.74 -0.80333,-1.72333 -1.07,0.05 -0.21,1.4 -0.01,2.99 -0.19,4.42 -3.26,25.04 -10.27667,49.07667 -21.05,72.11 -2.51,5.36 -6.73,10.25 -7.04,16.61 -0.88,17.8 -8.25,33.44 -17.63,48.71 -6.92667,11.28 -14.61,22.25333 -23.05,32.92 -2.86667,3.61333 -5.78667,7.31667 -8.76,11.11 -0.48667,0.62 -1.03,1.17667 -1.63,1.67 -0.61333,0.50667 -1.13,1.1 -1.55,1.78 -0.54667,0.9 -1.16333,1.77 -1.85,2.61 -12.59,15.4 -25.29,30.72 -36.86,46.89 -5.45,7.62 -7.87,18.03 -9.84,26.83 -3.593333,16.11333 -8.14,31.19333 -13.64,45.24 -2.493333,6.38667 -5.346667,12.43 -8.56,18.13 -1.8,3.2 -10.72,18.37 -15.54,12.26 -0.68,-0.86 -0.25,-2.07 -0.49,-3.02 -0.326667,-1.25333 -0.753333,-1.28667 -1.28,-0.1 -1.83,4.14 -5.34,14.31 -10.67,14.48 -3.546667,0.10667 -5.953333,-1.43333 -7.22,-4.62 -0.209662,-0.51969 -0.897493,-0.62508 -1.24,-0.19 -0.76,0.94667 -1.49,1.90333 -2.19,2.87 -2.2,3.05 -6.34,2.41 -9.1,0.4 -3.57,-2.59 -0.63,-10.37 0.9,-13.45 0.236418,-0.45407 -0.157897,-0.97982 -0.66,-0.88 -2.81,0.51 -6.84,0.27 -7.75,-3 -1.3,-4.73 -0.81,-9.94 0.05,-14.85 1.773333,-10.17333 4.316667,-19.64333 7.63,-28.41 3.18,-8.41333 7.573333,-15.49667 13.18,-21.25 0.322884,-0.3286 0.340328,-0.84758 0.04,-1.19 -0.293333,-0.34 -0.703333,-0.50667 -1.23,-0.5 -0.278815,6e-5 -0.546543,0.0916 -0.76,0.26 -4.246667,3.34667 -9.05,6.25667 -14.41,8.73 -1.546667,0.70667 -3.236667,1.18333 -5.07,1.43 -3.24,0.44 -7.32,1.02 -8.34,-3.06 v -5.04 c 1.89,-8.36 10.71,-11.9 18.05,-14.48 1.214197,-0.42225 2.32994,-1.08557 3.28,-1.95 4.853333,-4.38 9.59,-8.60667 14.21,-12.68 4.72,-4.16 11.45,-9.69 17.55,-8.89 0.42,0.0533 0.796667,-0.0467 1.13,-0.3 0.92,-0.7 1.69,-1.49333 2.31,-2.38 2.833333,-4.10667 5.91,-8.36 9.23,-12.76 3.766667,-4.99333 6.703333,-9.25 8.81,-12.77 6.546667,-10.92667 11.606667,-22.59667 15.18,-35.01 2.026667,-7.06667 3.946667,-14.08667 5.76,-21.06 5.72,-22.05333 15.62667,-42.48333 29.72,-61.29 4.66,-6.22 9.65667,-12.45667 14.99,-18.71 0.39308,-0.46353 0.60294,-1.054 0.59,-1.66 -0.28,-12.94667 0.27,-25.82667 1.65,-38.64 2.22667,-20.61333 7.64667,-40.31667 16.26,-59.11 0.53333,-1.15333 0.76,-2.34333 0.68,-3.57 -1.06,-16.84667 -0.0433,-35.03667 3.05,-54.57 3.2,-20.24 13.06,-40.07 33.4,-47.77 5.15333,-1.95333 10.72667,-3.49333 16.72,-4.62 1.53333,-0.28667 7.27,-1.04667 17.21,-2.28 7.33333,-0.90667 14.61333,-2.13667 21.84,-3.69 9.63333,-1.85333 18.05333,-5.90667 25.26,-12.16 0.35333,-0.30667 0.64,-0.65667 0.86,-1.05 0.61333,-0.13333 1.14,-0.47333 1.58,-1.02 4.60667,-5.78667 7.37667,-12.60667 8.31,-20.46 0.0467,-0.42667 -0.10333,-0.76 -0.45,-1 -3.21333,-2.21333 -6.00333,-5.19 -8.37,-8.93 -0.12667,-0.20667 -0.29667,-0.25333 -0.51,-0.14 -0.12,0.0667 -0.20333,0.13667 -0.25,0.21 -0.11333,-0.71333 -0.36667,-1.38 -0.76,-2 -6.65333,-10.54 -11.87,-21.78 -15.65,-33.72 -0.14124,-0.44693 -0.52604,-0.77342 -0.99,-0.84 -4.45,-0.65 -6.81,-5.29 -8.11,-9.16 -2.44667,-7.28667 -3.74667,-15 -3.9,-23.14 -0.0333,-1.54 0.38667,-2.85667 1.26,-3.95 0.24667,-0.30667 0.56333,-0.44667 0.95,-0.42 0.94667,0.08 1.88667,0.10333 2.82,0.07 5.42,-0.17 7.25,-5.92 8.02,-10.27 1.31,-7.45 2.25,-14.74 4.33,-22.04 0.17452,-0.60386 0.64526,-1.07836 1.25,-1.26 10.82,-3.22 21.32,-7.26333 31.5,-12.13 8.3,-3.96 16.2,-9.09 23.95,-14.33 4.34667,-2.933333 9.10667,-4.106667 14.28,-3.52 10.03,1.15 20.04,4.55 29.47,7.81 0.67736,0.236152 1.23278,0.741083 1.54,1.4 1.14667,2.5 1.93667,5.07333 2.37,7.72 1.68,10.24 3.37667,19.77333 5.09,28.6 0.87,4.45 3.85,17.51 9.55,17.9 1.3,0.0933 2.66,0.0167 4.08,-0.23 0.42,-0.0733 0.81,0.007 1.17,0.24 1.26,0.8 1.89,1.95333 1.89,3.46 0.03,6.92 -2.08,32.36 -11.81,33.17 -0.47681,0.0359 -0.88461,0.36051 -1.03,0.82 -1.62,5.23333 -3.67333,10.6 -6.16,16.1 -0.06,0.13333 -0.0233,0.23 0.11,0.29 z"
          />
        )}
        {side === "back" && (
          <Path
            stroke="#dfdfdf"
            vectorEffect="non-scaling-stroke"
            d="m 1194.44,206.54 c -3.1933,7.99333 -7.4233,15.23333 -12.69,21.72 -1.88,2.31333 -3.8467,4.26333 -5.9,5.85 -0.3221,0.24773 -0.4893,0.65057 -0.44,1.06 3.86,33.54 38.8,35.87 65.04,39.05 5.0133,0.60667 10.6067,1.62667 16.78,3.06 6.38,1.47333 11.8067,3.52333 16.28,6.15 14.57,8.53 23.01,23.61 26.16,40.09 3.7067,19.35333 5.04,39.21333 4,59.58 -0.05,0.96 0.16,2.23 0.57,3.12 9.9467,21.58667 15.71,44.73333 17.29,69.44 0.68,10.58667 0.91,19.95333 0.69,28.1 -0.02,0.86667 0.24,1.61 0.78,2.23 20.32,23.24 35.91,47.88 43.7,77 2.9133,10.89333 5.7433,20.80667 8.49,29.74 0.66,2.16667 1.44,4.27667 2.34,6.33 1.21,2.76 2.01,5.57 3.3,8.27 4.7267,9.88 8.63,16.84333 11.71,20.89 4.8733,6.39333 9.5,12.74333 13.88,19.05 0.6933,1 1.65,1.84 2.87,2.52 0.3,0.16667 0.6233,0.22667 0.97,0.18 4.82,-0.67 9.68,2.86 13.34,5.7 5.3867,4.2 10.4167,8.55 15.09,13.05 0.97,0.94 1.8,2.19 2.81,3.29 0.3867,0.42 0.87,0.71333 1.45,0.88 5.7467,1.69333 10.6367,3.94333 14.67,6.75 2.88,2.01333 4.6733,4.89667 5.38,8.65 v 5.01 c -0.52,1.79333 -1.6,2.74667 -3.24,2.86 -8.83,0.63 -17.91,-4.96 -24.24,-10.42 -0.64,-0.55333 -1.33,-0.62333 -2.07,-0.21 -0.28,0.15333 -0.45,0.41667 -0.51,0.79 -0.057,0.35981 0.054,0.72465 0.3,0.99 5.3933,5.72667 9.5833,12.27333 12.57,19.64 4.7133,11.63333 7.6733,23.37333 8.88,35.22 0.3333,3.31333 0.1933,6.36 -0.42,9.14 -0.83,3.72 -5.18,3.88 -8.31,3.66 -0.52,-0.0333 -0.6533,0.18 -0.4,0.64 1.5,2.73 4.15,9.73 2.03,12.51 -1,1.30667 -2.52,2.16 -4.56,2.56 -4.54,0.9 -5.48,-2.28 -7.85,-5.13 -0.3467,-0.42 -0.6133,-0.37 -0.8,0.15 -1.2067,3.36667 -3.7533,5.02 -7.64,4.96 -5.04,-0.09 -8.71,-10.14 -10.3,-14.11 -0.1733,-0.44667 -0.48,-0.77667 -0.92,-0.99 -0.4333,-0.20667 -0.6367,-0.07 -0.61,0.41 0.05,0.96 0.3,2.27 -0.22,3.1 -2.45,4 -7.21,0.07 -9.25,-2.45 -6.33,-7.84 -10.51,-16.48 -14.43,-25.97 -7.25,-17.58 -11.84,-37.32 -16.85,-56.41 -1.8,-6.87333 -3.2867,-11.19667 -4.46,-12.97 -6.3,-9.52 -14.4333,-20.36333 -24.4,-32.53 -15.11,-18.44 -29.91,-36.58 -44.05,-56.48 -8.8867,-12.51333 -15.8167,-24.99667 -20.79,-37.45 -2.9,-7.26667 -4.54,-15.05333 -4.92,-23.36 -0.09,-2.06 -0.75,-5.35 -1.64,-6.88 -5.3667,-9.18 -10.0867,-19.62333 -14.16,-31.33 -5.5933,-16.06667 -9.42,-30.98 -11.48,-44.74 -0.5467,-3.64 -0.91,-7.31333 -1.09,-11.02 -0.02,-0.32082 -0.3917,-0.48585 -0.63,-0.28 -0.1467,0.12 -0.2433,0.27667 -0.29,0.47 -1.2067,4.74 -3,9.11667 -5.38,13.13 -2.37,4.01 -6.03,7.14 -9.19,10.5 -0.7933,0.84667 -1.1967,1.84 -1.21,2.98 -0.38,33.86 -1.11,67.63667 -2.19,101.33 -0.1067,3.46667 0.3633,6.71667 1.41,9.75 1.67,4.83 5.75,8.89 8.75,13.05 19.15,26.59 30.52,57.65 35.84,89.85 6.62,39.99 5.98,81.18 1.39,121.55 -3.84,33.71333 -10.1567,68.23667 -18.95,103.57 -6.83,27.43 -13.74,52.3 -21.61,77.01 -1.6733,5.24 -3.05,11.17 -4.13,17.79 -2.6533,16.18 -4.6633,31.1133 -6.03,44.8 -0.51,5.14 -0.61,10.65 0.59,15.86 5.77,24.99 11.41,49.88 14.89,74.82 3.08,22 3.85,44.08 -1.95,65.56 -1.4733,5.4533 -3.1167,10.8133 -4.93,16.08 -7.4333,21.5733 -13.27,40.8667 -17.51,57.88 -3.1933,12.82 -6.2867,27.8233 -9.28,45.01 -0.8533,4.9 -1.2833,9.47 -1.29,13.71 0,5.1267 -0.1567,10.5767 -0.47,16.35 -0.11,2.14 0.27,4.76 1.1,6.78 2.72,6.61 5.78,14.73 4.14,21.82 -0.7333,3.1933 -1.0333,5.4033 -0.9,6.63 0.5,4.5133 1.6433,8.1033 3.43,10.77 4.73,7.07 9.6,13.97 12.12,21.89 0.82,2.56 1.88,4.7267 3.18,6.5 3.39,4.64 7.22,8.38 11.93,11.17 4.9267,2.9133 6.7967,7.6333 5.61,14.16 -0.18,0.9867 -0.6533,1.7833 -1.42,2.39 -0.8133,0.6467 -1.7933,1.0233 -2.94,1.13 -7.8467,0.7333 -15.72,1.2367 -23.62,1.51 h -29.64 c -6.9533,-0.1733 -13.86,-0.7167 -20.72,-1.63 -11.07,-1.47 -6.82,-32.77 -5.45,-39.86 1.26,-6.5067 2.58,-13.45 3.96,-20.83 1.32,-7.07 0.48,-13.46 0.26,-20.34 -0.1,-3.0067 0.2633,-6.4067 1.09,-10.2 0.26,-1.1733 0.3833,-2.57 0.37,-4.19 -0.1667,-20.2733 -0.7433,-42.1 -1.73,-65.48 -0.36,-8.34 -1.49,-16.99 -2.01,-25.27 -0.24,-3.7667 -0.8367,-7.5333 -1.79,-11.3 -2.8933,-11.5067 -5.1867,-21.89 -6.88,-31.15 -5.23,-28.74 -6.77,-58.03 -2.4,-86.44 2.09,-13.61 3.96,-27.35 6.27,-41.17 1.75,-10.47 3.26,-21.86 2.95,-33.05 -0.14,-4.9733 -0.3267,-10.2533 -0.56,-15.84 -0.4933,-11.92 -0.62,-23.23 -0.38,-33.93 0.087,-3.87333 -0.1633,-7.57667 -0.75,-11.11 -1,-6.06 -1.7367,-11.46667 -2.21,-16.22 -3.42,-34.68 -6.0767,-69.28 -7.97,-103.8 0,-0.0533 -0.38,-6.34667 -1.14,-18.88 -0.4333,-7.26 -0.7467,-14.53 -0.94,-21.81 -0.63,-23.97 -1.5,-48.33 0.89,-71.9 0.4533,-4.42 1.46,-8.21 3.02,-11.37 0.36,-0.73333 0.1367,-1.04333 -0.67,-0.93 -5.8,0.84667 -11.6067,0.83667 -17.42,-0.03 -0.5299,-0.077 -0.9242,0.47626 -0.67,0.94 1.1333,2.14 1.9167,4.39667 2.35,6.77 1.12,6.10667 1.78,12.78 1.98,20.02 0.52,19.33333 0.3867,38.51 -0.4,57.53 -2.02,49.02667 -5.3733,97.3 -10.06,144.82 -0.52,5.35 -1.42,10.71 -2.3,15.99 -0.5267,3.13333 -0.71,6.57 -0.55,10.31 0.22,4.96 0.2333,11.2 0.04,18.72 -0.24,9.2533 -0.53,18.5133 -0.87,27.78 -0.2,5.5333 -0.1433,10.4367 0.17,14.71 0.97,13.22 3.44,26.19 5.52,39.19 0.95,5.97 1.46,11.9 2.57,17.8 0.8133,4.32 1.46,8.6767 1.94,13.07 1.96,18.0733 2.0133,35.9033 0.16,53.49 -1.8,17.0067 -5.0233,34.5367 -9.67,52.59 -2.95,11.44 -3.63,22.52 -4.25,34.04 -1.2133,22.8933 -1.9,46.4567 -2.06,70.69 -0.013,2.6333 0.2133,5.2833 0.68,7.95 0.7533,4.2333 0.8467,9.2767 0.28,15.13 -0.34,3.5667 -0.2167,7.1567 0.37,10.77 1.0467,6.4333 2.1533,12.37 3.32,17.81 2.22,10.4 3.1733,20.2067 2.86,29.42 -0.14,4 -1.31,13.61 -5.91,15.24 -1.0133,0.3533 -2.0233,0.5833 -3.03,0.69 -6.26,0.6667 -12.55,1.0867 -18.87,1.26 H 1067 c -7.78,-0.2333 -15.53,-0.7367 -23.25,-1.51 -1.86,-0.19 -3.74,-1.13 -4.17,-3.14 -1.18,-5.57 0.09,-11.6 5.24,-14.4 4.46,-2.4267 8.6867,-6.4067 12.68,-11.94 1.1067,-1.54 1.9233,-3.2267 2.45,-5.06 1.3933,-4.8133 3.7333,-9.6767 7.02,-14.59 4.27,-6.37 10.95,-15.11 8.31,-23.7 -2.33,-7.59 0.58,-16.42 3.66,-23.53 0.8467,-1.9533 1.2233,-4.17 1.13,-6.65 -0.2467,-6.8467 -0.4367,-13.7033 -0.57,-20.57 -0.033,-1.8667 -0.22,-3.81 -0.56,-5.83 -0.53,-3.2 -0.78,-6.73 -1.93,-9.76 -0.57,-1.5 -0.46,-3.15 -0.75,-4.77 -4.4733,-25.64 -10.98,-51.18 -19.52,-76.62 -3.36,-10.0067 -6.23,-18.8433 -8.61,-26.51 -7.77,-24.97 -6.7,-50.73 -2.58,-76.67 3.0467,-19.1533 6.7333,-37.8133 11.06,-55.98 1.1133,-4.6733 2.1367,-9.5867 3.07,-14.74 0.7,-3.8333 0.7667,-8.9667 0.2,-15.4 -1.2667,-14.4467 -3.38,-29.87333 -6.34,-46.28 -1,-5.51333 -2.38,-11.08667 -4.14,-16.72 -8.6467,-27.59333 -16.36,-55.65333 -23.14,-84.18 -8.5133,-35.84 -14.49,-70.90333 -17.93,-105.19 -0.4067,-4.04 -0.95,-11.70667 -1.63,-23 -1.22,-20.12 -1.02,-40.2 0.6,-60.24 3.52,-43.7 15.84,-88.99 43.59,-123.06 4.52,-5.55 6.08,-10.55 5.88,-17.54 -1.0333,-36.71333 -1.7333,-70.39333 -2.1,-101.04 -0.013,-1.10667 -0.4167,-2.11333 -1.21,-3.02 -2.98,-3.41 -6.55,-6.22 -9.01,-10.18 -2.5267,-4.07333 -4.3433,-8.49 -5.45,-13.25 -0.027,-0.10667 -0.07,-0.20667 -0.13,-0.3 -0.073,-0.10667 -0.1467,-0.21 -0.22,-0.31 -0.38,-0.51333 -0.5867,-0.45333 -0.62,0.18 -0.1867,3.36 -0.5267,6.65667 -1.02,9.89 -3.18,20.91333 -9.0933,41.41667 -17.74,61.51 -2.1133,4.92 -4.57,9.73 -7.37,14.43 -1.38,2.31 -2.25,5.72 -2.35,8.5 -0.38,9.91333 -3.2067,20.34667 -8.48,31.3 -7.4,15.34 -17.09,29.69 -27.13,42.67 -11.44,14.81333 -24.26,30.94 -38.46,48.38 -8.59333,10.55333 -14.80667,18.88 -18.64,24.98 -2.16,3.44 -3.79333,7.21667 -4.9,11.33 -2.61333,9.71333 -5.20667,19.74667 -7.78,30.1 -1.21,4.83 -2.87,9.61 -4.37,14.42 -3.3,10.52667 -7.59333,20.83 -12.88,30.91 -1.67,3.2 -10.9,19.01 -16.08,13.75 -1.3,-1.32 -0.2,-2.61 -0.65,-3.85 -0.0533,-0.14 -0.15333,-0.22667 -0.3,-0.26 -0.33012,-0.0685 -0.66217,0.10802 -0.79,0.42 -1.68,3.98 -3.62333,7.83333 -5.83,11.56 -0.94,1.58 -2.4,2.82 -4.28,3.05 -3.94,0.48 -6.68,-1.13 -8.22,-4.83 -0.16296,-0.39045 -0.6952,-0.44195 -0.93,-0.09 -1.99,2.98 -3.89,6.12 -8.16,5 -2.69,-0.7 -5.36,-2.74 -4.91,-5.86 0.48,-3.3 1.34667,-6.37 2.6,-9.21 0.18054,-0.42201 -0.17743,-0.87656 -0.63,-0.8 -5.15,0.91 -8.19,-0.82 -8.39,-6.31 -0.14667,-4.06667 0.12333,-8.13667 0.81,-12.21 1.31333,-7.76667 3.32,-15.66 6.02,-23.68 3.48667,-10.37333 8.34,-18.76333 14.56,-25.17 0.38644,-0.4062 0.40798,-1.03511 0.05,-1.46 l -0.17,-0.21 c -0.54667,-0.65333 -1.14333,-0.70333 -1.79,-0.15 -4.04667,3.45333 -8.69333,6.37333 -13.94,8.76 -3.02,1.37333 -6.48333,1.99333 -10.39,1.86 -3.46,-0.12 -3.45,-3.61 -3.44,-6.16 0.02,-4.34667 1.84333,-7.82667 5.47,-10.44 3.33333,-2.40667 6.65333,-4.09333 9.96,-5.06 1.32,-0.38 2.59,-0.92333 3.81,-1.63 1.28,-0.73333 2.43,-1.57 3.45,-2.51 6.56667,-6.04 12.46,-11.28 17.68,-15.72 3.81333,-3.24 8.22333,-4.90333 13.23,-4.99 0.32334,-0.007 0.63475,-0.1269 0.88,-0.34 1.22,-1.1 2.23,-2.23 3.03,-3.39 2.92667,-4.25333 5.90333,-8.36333 8.93,-12.33 11.3,-14.82 19.21,-31.53 23.99,-49.16 2.43333,-8.99333 4.79667,-17.43667 7.09,-25.33 5.16667,-17.75333 13.26,-34.42 24.28,-50 5.38667,-7.60667 11.22333,-15.08 17.51,-22.42 0.78,-0.91 1.44,-1.79 1.43,-3.05 -0.04,-7.18667 0.15333,-15.32333 0.58,-24.41 1.2,-25.27333 6.98,-49.66 17.34,-73.16 0.47,-1.06 0.82,-2.02 0.74,-3.23 -1.05333,-16.56667 -0.03,-34.73667 3.07,-54.51 2.8,-17.8 10.26,-34.46 25.25,-43.96 4.9733,-3.16 11.2333,-5.6 18.78,-7.32 9.1267,-2.08667 18.7767,-3.55 28.95,-4.39 4.42,-0.36667 10.0367,-1.44667 16.85,-3.24 10.1122,-2.54586 26.2145,-13.0245 27.26,-14.15 4.52,-6.03333 7.2267,-12.83 8.12,-20.39 0.031,-0.22254 -0.061,-0.44444 -0.24,-0.58 -3.2333,-2.39333 -6.22,-5.54333 -8.96,-9.45 l -0.39,-12.23 c -0.01,-0.33918 0.3411,-0.57024 0.65,-0.43 15.8831,7.16 15.9397,7.22024 19.73,8.28 4.4042,0.92173 8.3867,0.98 12.58,1.47 4.92,0.4 9.14,0.52 12.66,0.36 1.7667,-0.08 3.9733,-0.45333 6.62,-1.12 l 12.92,-3.7 c 9.58,-3.26667 19.2933,-6.93333 29.14,-11 z"
          />
        )}
      </G>
      {children}
    </Svg>
  );
};
