<script setup lang="ts">
defineProps<{ ariaLabel?: string }>();
</script>
<template>
  <svg viewBox="0 0 64 64" width="1em" height="1em" fill="currentColor"
       :role="ariaLabel ? 'img' : 'presentation'"
       :aria-label="ariaLabel || undefined"><g fill="none" stroke-linecap="square" stroke-miterlimit="10" stroke-width="3"><path d="M5.5 50.5v9h9m12-21-21 21 1-1" data-color="color-2"/><path d="M26.5 5.5v33h33"/></g></svg>
</template>
