<script setup lang="ts">
defineProps<{ ariaLabel?: string }>();
</script>
<template>
  <svg viewBox="0 0 16 16" width="1em" height="1em" fill="currentColor"
       :role="ariaLabel ? 'img' : 'presentation'"
       :aria-label="ariaLabel || undefined"><g fill="currentColor"><path d="M10 14H6c0 1.1.9 2 2 2s2-.9 2-2" data-color="color-2"/><path d="M15 11h-.5c-.7-.7-1.5-1.7-1.5-3V5c0-2.8-2.2-5-5-5S3 2.2 3 5v3c0 1.3-.8 2.3-1.5 3H1c-.6 0-1 .4-1 1s.4 1 1 1h14c.6 0 1-.4 1-1s-.4-1-1-1"/></g></svg>
</template>
