import * as React from 'react';
export interface Stethoscope64Props extends React.SVGProps<SVGSVGElement> { ariaLabel?: string }
export default function Stethoscope64({ ariaLabel, ...props }: Stethoscope64Props) {
  return (
    <svg viewBox="0 0 64 64" width="1em" height="1em" fill="currentColor"
         role={ariaLabel ? 'img' : 'presentation'}
         aria-label={ariaLabel || undefined}
         {...props}><g fill="none" stroke-linecap="square" stroke-miterlimit="10" stroke-width="3" transform="translate(.5 .5)"><path d="M20 42v4c0 8.8 7.2 16 16 16h2c8.8 0 16-7.2 16-16" data-color="color-2"/><circle cx="54" cy="38" r="8" data-color="color-2"/><path d="M30 4h7.7c1.2 0 2.2 1.1 2 2.3l-5.1 32.3c-.3 1.9-2 3.4-4 3.4H11.4c-2 0-3.6-1.4-4-3.4l-5-32.3C2.2 5.1 3.1 4 4.3 4H12m0-2v6m18-6v6"/></g></svg>
  );
}
