import * as React from 'react';
export interface MedicalMask64Props extends React.SVGProps<SVGSVGElement> { ariaLabel?: string }
export default function MedicalMask64({ ariaLabel, ...props }: MedicalMask64Props) {
  return (
    <svg viewBox="0 0 64 64" width="1em" height="1em" fill="currentColor"
         role={ariaLabel ? 'img' : 'presentation'}
         aria-label={ariaLabel || undefined}
         {...props}><g fill="none" stroke-linecap="square" stroke-miterlimit="10" stroke-width="3"><path d="M52.5 50.77V13.5a5 5 0 0 1 10 0v23c0 11.6-12 18-30 18s-30-6.4-30-18v-23a5 5 0 0 1 10 0v37.353" data-cap="butt"/><path d="M52.5 18.243c-5.113-2.453-11.95-3.743-20-3.743s-14.887 1.29-20 3.743" data-cap="butt"/><path d="M46.5 34.5h-28m0 9.2a110 110 0 0 0 14 .8 110 110 0 0 0 14-.8m0-18.4a110 110 0 0 0-14-.8 110 110 0 0 0-14 .8" data-color="color-2"/></g></svg>
  );
}
