import * as React from 'react';
export interface Syringe48Props extends React.SVGProps<SVGSVGElement> { ariaLabel?: string }
export default function Syringe48({ ariaLabel, ...props }: Syringe48Props) {
  return (
    <svg viewBox="0 0 48 48" width="1em" height="1em" fill="currentColor"
         role={ariaLabel ? 'img' : 'presentation'}
         aria-label={ariaLabel || undefined}
         {...props}><g fill="none" stroke-linecap="square" stroke-miterlimit="10" stroke-width="3"><path d="M13.9 35.1 4 45m19.8-28.3 2.8 2.9m-7 1.4 2.8 2.8m-7.1 1.4 2.8 2.8" data-color="color-2"/><path d="m36.5 18.1 7.1-7m-5.7-5.7-7 7.1" data-cap="butt"/><path d="m23.8 5.4 19.8 19.8M36.5 4l8.5 8.5m-7.1 7.1L18.1 39.3l-8.4-8.4 19.7-19.8"/></g></svg>
  );
}
