import * as React from 'react';
export interface MedicalMask48Props extends React.SVGProps<SVGSVGElement> { ariaLabel?: string }
export default function MedicalMask48({ ariaLabel, ...props }: MedicalMask48Props) {
  return (
    <svg viewBox="0 0 48 48" width="1em" height="1em" fill="currentColor"
         role={ariaLabel ? 'img' : 'presentation'}
         aria-label={ariaLabel || undefined}
         {...props}><g fill="none" stroke-linecap="square" stroke-miterlimit="10" stroke-width="3"><path d="M38.5 37.825V10.5a4 4 0 0 1 8 0v16c0 8.837-9 14-22 14s-22-5.163-22-14v-16a4 4 0 0 1 8 0v27.327" data-cap="butt"/><path d="M38.5 13.187a33.1 33.1 0 0 0-14-2.687 33.1 33.1 0 0 0-14 2.687" data-cap="butt"/><path d="M32.5 20.753c-2.434-.165-5.114-.253-8-.253s-5.566.088-8 .253m16 9.494c-2.434.165-5.114.253-8 .253s-5.566-.088-8-.253" data-color="color-2"/></g></svg>
  );
}
