import * as React from 'react';
export interface MedicalClipboard48Props extends React.SVGProps<SVGSVGElement> { ariaLabel?: string }
export default function MedicalClipboard48({ ariaLabel, ...props }: MedicalClipboard48Props) {
  return (
    <svg viewBox="0 0 48 48" width="1em" height="1em" fill="currentColor"
         role={ariaLabel ? 'img' : 'presentation'}
         aria-label={ariaLabel || undefined}
         {...props}><g fill="none" stroke-linecap="square" stroke-miterlimit="10" stroke-width="3"><path d="M32.5 4.5h12v42h-40v-42h12" data-cap="butt"/><path d="M32.5 10.5h6v30h-28v-30h6" data-cap="butt"/><path d="M16.5 2.5v12h4c0-2.2 1.8-4 4-4s4 1.8 4 4h4v-12z"/><path d="M24.5 22.5v8m-4-4h8" data-color="color-2"/></g></svg>
  );
}
