import * as React from 'react';
export interface Syringe32Props extends React.SVGProps<SVGSVGElement> { ariaLabel?: string }
export default function Syringe32({ ariaLabel, ...props }: Syringe32Props) {
  return (
    <svg viewBox="0 0 32 32" width="1em" height="1em" fill="currentColor"
         role={ariaLabel ? 'img' : 'presentation'}
         aria-label={ariaLabel || undefined}
         {...props}><g fill="none" stroke-linecap="square" stroke-miterlimit="10" stroke-width="2"><path d="m9 23-7 7m14-20 2 2m-5 1 2 2m-5 1 2 2" data-color="color-2"/><path d="m24.5 10.5 5-5m-3-3-5 5" data-cap="butt"/><path d="m16 2 14 14"/><path d="m25 1 6 6" data-cap="butt"/><path d="M26 12 12 26l-6-6L20 6"/></g></svg>
  );
}
