import * as React from 'react';
export interface Microscope32Props extends React.SVGProps<SVGSVGElement> { ariaLabel?: string }
export default function Microscope32({ ariaLabel, ...props }: Microscope32Props) {
  return (
    <svg viewBox="0 0 32 32" width="1em" height="1em" fill="currentColor"
         role={ariaLabel ? 'img' : 'presentation'}
         aria-label={ariaLabel || undefined}
         {...props}><g fill="none" stroke-linecap="square" stroke-miterlimit="10" stroke-width="2"><path d="m18.192 15.054-1.5-2.598M8.594 4.429 13.79 1.43l5.5 9.526-2.598 1.5-2.599 1.5z"/><path d="M6.693 23.772 5.4 21.829A9 9 0 0 1 8.433 9.243l7.422-4.236" data-cap="butt"/><path d="m16.991 22.675 8.531-4.925" data-color="color-2"/><path d="M28 31H4v-2.5a5.5 5.5 0 0 1 11 0l-.055 2.5"/></g></svg>
  );
}
