import * as React from 'react';
export interface Microscope24Props extends React.SVGProps<SVGSVGElement> { ariaLabel?: string }
export default function Microscope24({ ariaLabel, ...props }: Microscope24Props) {
  return (
    <svg viewBox="0 0 24 24" width="1em" height="1em" fill="currentColor"
         role={ariaLabel ? 'img' : 'presentation'}
         aria-label={ariaLabel || undefined}
         {...props}><g fill="currentColor"><path d="m13.494 18.405 6.131-3.539a1 1 0 1 0-1-1.732L12.5 16.673a7 7 0 0 1 .994 1.732" data-color="color-2"/><path d="M21 22h-9v-1a5.006 5.006 0 0 0-5-5 5 5 0 0 0-1.787.345l-.313-.484a4.99 4.99 0 0 1 1.435-7.088l1.382-.8 1.417 2.454a1 1 0 0 0 1.366.366l.866-.5.7 1.206a1 1 0 0 0 .867.5 1 1 0 0 0 .866-1.5l-.7-1.206.866-.5a1 1 0 0 0 .366-1.366L10.33.5A1 1 0 0 0 8.964.134l-3.464 2A1 1 0 0 0 5.134 3.5l1.583 2.743-1.41.816a6.984 6.984 0 0 0-2.063 9.916l.282.442A4.98 4.98 0 0 0 2 21v2a1 1 0 0 0 1 1h18a1 1 0 0 0 0-2"/></g></svg>
  );
}
