import * as React from 'react';
export interface Syringe16Props extends React.SVGProps<SVGSVGElement> { ariaLabel?: string }
export default function Syringe16({ ariaLabel, ...props }: Syringe16Props) {
  return (
    <svg viewBox="0 0 16 16" width="1em" height="1em" fill="currentColor"
         role={ariaLabel ? 'img' : 'presentation'}
         aria-label={ariaLabel || undefined}
         {...props}><path fill="currentColor" d="m12.8 5.1 1-1 .5.5c.4.4 1 .4 1.4 0s.4-1 0-1.4L12.8.3c-.4-.4-1-.4-1.4 0s-.4 1 0 1.4l.5.5-1 1-3-3c-.4-.4-1-.4-1.4 0s-.4 1 0 1.4l1.7 1.7-6 6.2c-.4.4-.4 1 0 1.4l.8.7-2.7 2.7c-.4.4-.4 1 0 1.4s1 .4 1.4 0L4.4 13l.7.7c.4.4 1 .4 1.4 0l6.1-6.1 1.7 1.7c.4.4 1 .4 1.4 0s.4-1 0-1.4z"/></svg>
  );
}
