import * as React from 'react';
export interface Microscope16Props extends React.SVGProps<SVGSVGElement> { ariaLabel?: string }
export default function Microscope16({ ariaLabel, ...props }: Microscope16Props) {
  return (
    <svg viewBox="0 0 16 16" width="1em" height="1em" fill="currentColor"
         role={ariaLabel ? 'img' : 'presentation'}
         aria-label={ariaLabel || undefined}
         {...props}><g fill="currentColor"><path d="M8 13a3 3 0 0 0-3-3 3 3 0 0 0-1.013.188 2.989 2.989 0 0 1 1.467-5.133l1.2 2.074a.5.5 0 0 0 .683.183l1.734-1a.5.5 0 0 0 .183-.683l-3-5.2A.5.5 0 0 0 5.567.25l-1.734 1a.5.5 0 0 0-.182.683l.777 1.345a4.975 4.975 0 0 0-2.007 8.212A3 3 0 0 0 2 13v3h12v-2H8Z"/><path d="m8.83 11.911 4.457-2.573-1-1.733-4.456 2.573a4 4 0 0 1 .999 1.733" data-color="color-2"/></g></svg>
  );
}
