import * as React from 'react';
export interface InfraredThermometer16Props extends React.SVGProps<SVGSVGElement> { ariaLabel?: string }
export default function InfraredThermometer16({ ariaLabel, ...props }: InfraredThermometer16Props) {
  return (
    <svg viewBox="0 0 16 16" width="1em" height="1em" fill="currentColor"
         role={ariaLabel ? 'img' : 'presentation'}
         aria-label={ariaLabel || undefined}
         {...props}><g fill="currentColor"><path d="m10.027 10.245-.5 1.505H10A2.75 2.75 0 0 0 12.75 9h-1.5a1.25 1.25 0 0 1-1.223 1.245" data-color="color-2"/><path d="M15.763.354A1 1 0 0 0 15 0H5a1 1 0 0 0-.895.553l-2 4a1 1 0 0 0 0 .894l.806 1.611-2.848 7.59A1 1 0 0 0 1 16h6.793a1.5 1.5 0 0 0 1.061-2.561l-.71-.71L9.721 8H14a1 1 0 0 0 .986-.836l1-6a1 1 0 0 0-.223-.81M12 5H7V3h5Z"/></g></svg>
  );
}
