import * as React from 'react';
export interface ComputerMonitor16Props extends React.SVGProps<SVGSVGElement> { ariaLabel?: string }
export default function ComputerMonitor16({ ariaLabel, ...props }: ComputerMonitor16Props) {
  return (
    <svg viewBox="0 0 16 16" width="1em" height="1em" fill="currentColor"
         role={ariaLabel ? 'img' : 'presentation'}
         aria-label={ariaLabel || undefined}
         {...props}><g fill="currentColor"><path d="M13 16H3c-.6 0-1-.4-1-1V1c0-.6.4-1 1-1h10c.6 0 1 .4 1 1v14c0 .6-.4 1-1 1m-9-2h8V2H4z"/><path d="M6 4h4v2H6z" data-color="color-2"/><circle cx="8" cy="10" r="2" data-color="color-2"/></g></svg>
  );
}
