'use client';
'use no memo'; // fixes rerendering with react compiler, v9 of tanstack table will fix this

import { Button } from '@/components/ui/button';
import {
  DropdownMenu,
  DropdownMenuCheckboxItem,
  DropdownMenuContent,
  DropdownMenuLabel,
  DropdownMenuSeparator,
  DropdownMenuTrigger,
} from '@/components/ui/dropdown-menu';
import type { Table } from '@tanstack/react-table';
import { Settings2 } from 'lucide-react';

interface DataTableViewOptionsProps<TData> {
  table: Table<TData>;
}

export function DataTableViewOptions<TData>({ table }: DataTableViewOptionsProps<TData>) {
  return (
    <DropdownMenu>
      <DropdownMenuTrigger asChild>
        <Button variant="outline" size="sm" className="ml-auto hidden h-8 lg:flex">
          <Settings2 />
          View
        </Button>
      </DropdownMenuTrigger>
      <DropdownMenuContent align="end" className="w-[150px]">
        <DropdownMenuLabel>Toggle columns</DropdownMenuLabel>
        <DropdownMenuSeparator />
        {table
          .getAllColumns()
          .filter((column) => typeof column.accessorFn !== 'undefined' && column.getCanHide())
          .map((column) => {
            return (
              <DropdownMenuCheckboxItem
                key={column.id}
                className="capitalize"
                checked={column.getIsVisible()}
                onCheckedChange={(value) => column.toggleVisibility(!!value)}
              >
                {column.id}
              </DropdownMenuCheckboxItem>
            );
          })}
      </DropdownMenuContent>
    </DropdownMenu>
  );
}
