<template>
  <svg
    v-bind="$attrs"
    :width="size"
    :height="size"
    xmlns="http://www.w3.org/2000/svg"
    class="ui-svg-inline"
    viewBox="0 0 24 24"
    fill="currentColor"
  >
    <path
      d="M2,13.5v2a1,1,0,0,0,1,1H13a3,3,0,0,0,6,0h2a1,1,0,0,0,1-1v-8a3,3,0,0,0-3-3H9a3,3,0,0,0-3,3v7H4v-1a1,1,0,0,0-2,0Zm13,3a1,1,0,1,1,1,1A1,1,0,0,1,15,16.5Zm-7-6H20v4H18.22a3,3,0,0,0-4.44,0H8Zm0-3a1,1,0,0,1,1-1H19a1,1,0,0,1,1,1v1H8Z"
    />
  </svg>
</template>

<script>
import '../utils/style.css'

export default {
  props: {
    size: {
      type: String,
      default: '1em'
    }
  }
}
</script>