import * as React from 'react'
import type { SVGProps, Ref } from 'react'
const SvgIdeaplaceDefaultLight = (
    props: SVGProps<SVGSVGElement>,
    ref: Ref<SVGSVGElement>
) => (
    <svg
        fill="none"
        xmlns="http://www.w3.org/2000/svg"
        viewBox="0 0 78 31"
        preserveAspectRatio="xMidYMid meet"
        focusable="false"
        ref={ref}
        {...props}
    >
        <path
            d="M74.056 10.764c.693 0 1.267.545 1.267 1.252 0 .722-.574 1.252-1.266 1.252a1.254 1.254 0 0 1-1.267-1.252c0-.707.574-1.252 1.266-1.252m0 2.327c.59 0 1.061-.471 1.061-1.075s-.471-1.06-1.06-1.06a1.05 1.05 0 0 0-1.061 1.075c0 .604.471 1.06 1.06 1.06m-.47-1.782h.53c.353 0 .515.132.515.412 0 .265-.162.368-.383.398l.412.633h-.22l-.398-.618h-.265v.618h-.207V11.31h.015Zm.205.648h.25c.207 0 .399-.015.399-.236 0-.206-.177-.22-.325-.22h-.309v.456zM26.252 4.149h3.168c2.298 0 2.887 1.385 2.887 2.52 0 1.134-.59 2.518-2.888 2.518h-1.944v3.963h-1.223v-9Zm1.223 3.963h1.606c.972 0 1.93-.236 1.93-1.444s-.973-1.444-1.93-1.444h-1.606zm5.981-4.582h1.15v9.62h-1.15zm2.667 4.332c.633-.604 1.546-.884 2.386-.884 1.783 0 2.52.972 2.52 2.003v3.08c0 .412.014.78.043 1.09h-1.001a10 10 0 0 1-.045-.914h-.029c-.516.78-1.193 1.075-2.107 1.075-1.12 0-2.092-.633-2.092-1.812 0-1.547 1.488-2.092 3.315-2.092h.84v-.25c0-.619-.457-1.267-1.444-1.267-.884 0-1.296.368-1.724.692zm3.24 2.386c-1.075 0-2.4.192-2.4 1.164 0 .692.515.972 1.296.972 1.267 0 1.723-.943 1.723-1.753v-.383zm3.02-3.123h1.15v.928h.03c.294-.633 1.06-1.075 1.988-1.075 1.164 0 2.18.692 2.18 2.298v3.874h-1.149V9.585c0-1.134-.648-1.547-1.37-1.547-.958 0-1.68.604-1.68 2.004v3.108h-1.148zm5.907 0h1.327l1.797 4.61 1.723-4.61h1.223l-2.357 6.025h-1.252zm7.544-3.005a.85.85 0 0 1 .84.84.85.85 0 0 1-.84.84.85.85 0 0 1-.84-.84c.015-.457.383-.84.84-.84m-.56 3.005h1.149v6.025h-1.15zm3.506 3.432c0 1.061.972 1.753 2.033 1.753.692 0 1.208-.353 1.65-.898l.87.663c-.634.825-1.518 1.237-2.667 1.237-1.915 0-3.109-1.37-3.109-3.167 0-1.812 1.311-3.167 3.123-3.167 2.122 0 2.932 1.635 2.932 3.182v.412H58.78zm3.61-.913c-.03-1.002-.59-1.753-1.739-1.753-1.134 0-1.871.958-1.871 1.753zm1.428-2.519H65.1l1.355 4.508h.03l1.444-4.508h1.207l1.533 4.508h.03l1.296-4.508h1.207l-1.944 6.025h-1.164l-1.59-4.508h-.03L67.03 13.15h-1.238zm-37.566 9.738h1.223v9h-1.223zm8.958 9.001h-1.15v-.87h-.03c-.441.649-1.28 1.017-2.091 1.017-1.871 0-3.064-1.385-3.064-3.167 0-1.812 1.208-3.168 3.064-3.168.869 0 1.694.398 2.092 1.017h.03v-4.45h1.148v9.62Zm-1.135-3.02c0-1.223-.766-2.092-1.989-2.092s-1.989.884-1.989 2.092.766 2.092 1.99 2.092c1.222 0 1.988-.87 1.988-2.092m3.418.427c0 1.06.972 1.753 2.033 1.753.692 0 1.208-.354 1.65-.899l.869.663c-.634.825-1.518 1.238-2.667 1.238-1.915 0-3.108-1.37-3.108-3.168 0-1.811 1.311-3.167 3.123-3.167 2.121 0 2.932 1.635 2.932 3.182v.413h-4.832zm3.609-.913c-.03-1.002-.59-1.753-1.738-1.753-1.135 0-1.871.957-1.871 1.753zm2.298-1.783c.634-.604 1.547-.884 2.387-.884 1.782 0 2.519.973 2.519 2.004v3.079c0 .412.015.78.044 1.09h-1.017a10 10 0 0 1-.044-.914c-.515.781-1.193 1.076-2.106 1.076-1.12 0-2.092-.634-2.092-1.812 0-1.547 1.488-2.092 3.314-2.092h.84v-.25c0-.62-.457-1.267-1.444-1.267-.884 0-1.296.368-1.723.692zm3.241 2.387c-1.075 0-2.401.191-2.401 1.163 0 .693.515.973 1.296.973 1.267 0 1.724-.943 1.724-1.753v-.383zm3.315-6.099h3.167c2.298 0 2.887 1.384 2.887 2.519 0 1.134-.589 2.519-2.887 2.519h-1.945v3.963h-1.222zm1.222 3.963h1.606c.972 0 1.93-.236 1.93-1.444s-.972-1.444-1.93-1.444h-1.606zm5.79-4.582h1.149v9.62h-1.15v-9.62Zm2.682 4.331c.633-.604 1.546-.884 2.386-.884 1.782 0 2.519.973 2.519 2.004v3.079c0 .412.015.78.044 1.09h-1.016a10 10 0 0 1-.044-.914h-.03c-.516.781-1.193 1.076-2.107 1.076-1.12 0-2.092-.634-2.092-1.812 0-1.547 1.488-2.092 3.315-2.092h.84v-.25c0-.62-.457-1.267-1.444-1.267-.884 0-1.296.368-1.724.692zm3.226 2.387c-1.076 0-2.402.191-2.402 1.163 0 .693.516.973 1.297.973 1.267 0 1.723-.943 1.723-1.753v-.383zm7.336-1.518c-.413-.442-.87-.677-1.503-.677-1.252 0-1.886 1.001-1.886 2.136 0 1.134.767 2.047 1.945 2.047.634 0 1.076-.235 1.459-.677l.81.81c-.604.663-1.414.928-2.284.928-1.856 0-3.152-1.282-3.152-3.138s1.267-3.182 3.152-3.182c.884 0 1.724.31 2.313.958zm2.372 1.827c0 1.06.972 1.753 2.033 1.753.692 0 1.208-.354 1.65-.899l.869.663c-.633.825-1.517 1.238-2.666 1.238-1.916 0-3.109-1.37-3.109-3.168 0-1.811 1.311-3.167 3.123-3.167 2.122 0 2.932 1.635 2.932 3.182v.413h-4.832zm3.61-.913c-.03-1.002-.59-1.753-1.74-1.753-1.134 0-1.87.957-1.87 1.753z"
            fill="#fff"
        />
        <path
            d="M0 13.097c0-4.611 3.742-8.5 8.338-8.5 4.597 0 8.338 3.889 8.338 8.5 0 4.61-3.727 8.353-8.338 8.353S0 17.707 0 13.097"
            fill="url(#ideaplace-default-light_svg__a)"
        />
        <path
            d="M8.426 20.846c-2.357 0-4.507-.796-6.157-2.107.073.103 2.003 2.018 2.003 5.657 0 3.491 8.132 3.52 8.132 0 0-3.698 1.665-5.083 2.092-5.73-1.62 1.237-3.786 2.18-6.07 2.18"
            fill="url(#ideaplace-default-light_svg__b)"
        />
        <path
            d="M8.5 2.49h-.044a.41.41 0 0 1-.413-.413V.943c0-.221.177-.413.413-.413H8.5c.221 0 .413.177.413.413v1.134a.41.41 0 0 1-.413.413m6.511.471-.029-.03a.4.4 0 0 0-.575 0l-.795.796a.4.4 0 0 0 0 .575l.03.03a.4.4 0 0 0 .574 0l.795-.796a.43.43 0 0 0 0-.575M1.635 2.932l-.03.03a.4.4 0 0 0 0 .574l.796.795a.4.4 0 0 0 .575 0l.03-.03a.4.4 0 0 0 0-.574l-.796-.795a.4.4 0 0 0-.575 0"
            fill="#fff"
        />
        <defs>
            <radialGradient
                id="ideaplace-default-light_svg__a"
                cx={0}
                cy={0}
                r={1}
                gradientUnits="userSpaceOnUse"
                gradientTransform="translate(8.345 13.024)scale(8.38439)"
            >
                <stop offset={0.574} stopColor="#fff" />
                <stop offset={1} stopColor="#fff" stopOpacity={0.9} />
            </radialGradient>
            <linearGradient
                id="ideaplace-default-light_svg__b"
                x1={8.384}
                y1={18.664}
                x2={8.384}
                y2={27.028}
                gradientUnits="userSpaceOnUse"
            >
                <stop offset={0.414} stopColor="#fff" />
                <stop offset={1} stopColor="#fff" stopOpacity={0.7} />
            </linearGradient>
        </defs>
    </svg>
)
export default React.forwardRef(SvgIdeaplaceDefaultLight)
