import { userFriendlySecond } from "@definitions";

describe("userFriendlySecond Helper", () => {
    it("converts milliseconds to seconds correctly", async () => {
        const miliseconds = 5000;

        const seconds = userFriendlySecond(miliseconds);

        expect(seconds).toBe(5);
    });
});
