/* GENERATED FILE */
import * as React from "react";
import Svg, { Path } from "react-native-svg";
import { IconProps } from '../lib'

const DownloadSimple = (props: IconProps) => <Svg fill="currentColor" viewBox="0 0 256 256" width={props.size} height={props.size} {...props}><Path d="M222 144v64a6 6 0 0 1-6 6H40a6 6 0 0 1-6-6v-64a6 6 0 0 1 12 0v58h164v-58a6 6 0 0 1 12 0Zm-98.24 4.24a6 6 0 0 0 8.48 0l40-40a6 6 0 0 0-8.48-8.48L134 129.51V32a6 6 0 0 0-12 0v97.51L92.24 99.76a6 6 0 0 0-8.48 8.48Z" /></Svg>;
export default DownloadSimple;