/* GENERATED FILE */
import * as React from "react";
import Svg, { Path } from "react-native-svg";
import { IconProps } from '../lib'

const Syringe = (props: IconProps) => <Svg fill={props.color} viewBox="0 0 256 256" width={props.size} height={props.size} {...props}><Path d="m196 116-89.66 89.66a8 8 0 0 1-5.65 2.34H48v-52.69a8 8 0 0 1 2.34-5.65L140 60Z" opacity={0.2} /><Path d="m237.66 66.34-48-48a8 8 0 0 0-11.32 11.32L196.69 48 168 76.69l-34.34-34.35a8 8 0 0 0-11.32 11.32l6.35 6.34-84 84A15.86 15.86 0 0 0 40 155.31v49.38l-21.66 21.65a8 8 0 0 0 11.32 11.32L51.31 216h49.38a15.86 15.86 0 0 0 11.31-4.69l84-84 6.34 6.35a8 8 0 0 0 11.32-11.32L179.31 88 208 59.31l18.34 18.35a8 8 0 0 0 11.32-11.32ZM100.69 200H56v-44.69l18-18 20.34 20.35a8 8 0 0 0 11.32-11.32L85.31 126 98 113.31l20.34 20.35a8 8 0 0 0 11.32-11.32L109.31 102 140 71.31 184.69 116Z" /></Svg>;
export default Syringe;