/* GENERATED FILE */
import * as React from "react";
import Svg, { Path } from "react-native-svg";
import { IconProps } from '../lib'

const Table = (props: IconProps) => <Svg fill="currentColor" viewBox="0 0 256 256" width={props.size} height={props.size} {...props}><Path d="M224 44H32a12 12 0 0 0-12 12v136a20 20 0 0 0 20 20h176a20 20 0 0 0 20-20V56a12 12 0 0 0-12-12ZM44 116h32v24H44Zm56 0h112v24H100Zm112-48v24H44V68ZM44 164h32v24H44Zm56 24v-24h112v24Z" /></Svg>;
export default Table;