import * as React from "react";
import { SVGProps } from "react";
const SvgLogoName = (props: SVGProps<SVGSVGElement>) => (
	<svg
		width="1em"
		height="1em"
		viewBox="0 0 2977 512"
		fill="none"
		xmlns="http://www.w3.org/2000/svg"
		className="icon"
		aria-hidden={true}
		focusable="false"
		{...props}
	>
		<path
			d="M143.221 169.766h-1.631L51.278 39.86H32v165.052h20.02V75.302h1.483l90.015 129.61h19.278V39.86h-19.575v129.906ZM271.2 128.54c-2.224 1.187-5.635 2.076-10.38 2.67-4.746.444-10.826 1.186-18.389 2.224-5.784.741-11.419 1.78-17.202 2.966-5.636 1.335-10.826 3.114-15.571 5.635-4.746 2.521-8.453 5.932-11.271 10.381-2.817 4.449-4.152 10.232-4.152 17.35 0 8.008 1.928 14.978 5.635 20.613 3.708 5.636 8.898 9.936 15.275 12.902 6.376 2.966 13.495 4.449 21.354 4.449 7.267 0 13.347-1.038 18.241-3.263 5.042-2.076 9.046-4.745 12.011-7.859 2.966-3.114 5.191-5.932 6.377-8.601h1.038v16.757h18.982V123.35c0-9.788-1.631-17.647-4.894-23.58-3.262-5.93-7.266-10.231-12.16-13.197-4.894-2.966-9.936-4.894-15.126-5.784-5.19-.89-9.788-1.483-13.792-1.483-6.228 0-12.605.89-18.981 2.521-6.377 1.632-12.309 4.597-17.647 8.898-5.339 4.152-9.788 10.084-12.902 17.647l18.092 6.377c2.076-4.449 5.783-8.75 10.825-12.754 5.191-4.004 12.309-5.931 21.355-5.931 9.046 0 15.274 2.224 19.575 6.673s6.525 10.529 6.525 18.537v.593c0 3.114-1.038 5.19-3.263 6.377l.445.296Zm3.263 31.587c0 5.19-1.335 10.084-4.004 14.681-2.67 4.746-6.525 8.453-11.716 11.419-5.19 2.966-11.567 4.449-19.13 4.449-7.563 0-13.791-1.631-18.685-5.042-4.894-3.411-7.415-8.305-7.415-14.978 0-4.894 1.335-8.601 3.856-11.419 2.669-2.817 6.08-4.893 10.381-6.376 4.3-1.483 8.898-2.521 13.791-3.115 2.076-.296 4.746-.593 8.008-1.038 3.263-.445 6.673-.889 10.233-1.483 3.559-.593 6.673-1.186 9.342-2.076 2.669-.741 4.449-1.631 5.339-2.669v17.647ZM336.598 174.66c0 7.266 1.632 13.198 5.043 17.944 3.41 4.745 7.563 8.304 12.753 10.529 5.19 2.224 10.381 3.411 15.719 3.411 3.559 0 6.525-.297 8.75-.742 2.224-.445 4.152-1.038 5.338-1.483l-3.855-17.054c-.742.148-1.928.297-3.263.593-1.335.297-3.114.297-5.19.297-2.818 0-5.487-.445-7.86-1.335-2.521-.89-4.597-2.669-6.08-5.338-1.631-2.67-2.373-6.674-2.373-12.012V97.25h26.397V81.086H355.58v-29.66h-18.982v29.66h-18.685V97.25h18.685v77.41ZM429.728 81.086h-18.982v123.826h18.982V81.086ZM420.385 34.67c-3.707 0-6.821 1.334-9.491 3.855-2.669 2.521-4.004 5.635-4.004 9.046 0 3.41 1.335 6.525 4.004 9.046 2.67 2.521 5.784 3.856 9.491 3.856 3.708 0 6.822-1.187 9.491-3.856 2.67-2.67 4.004-5.635 4.004-9.046 0-3.41-1.334-6.525-4.004-9.046-2.669-2.521-5.783-3.856-9.491-3.856ZM544.212 87.462c-8.453-5.338-18.241-8.008-29.363-8.008s-20.909 2.67-29.362 8.008c-8.453 5.34-14.978 12.754-19.723 22.393-4.746 9.639-7.118 20.91-7.118 33.811 0 12.902 2.372 24.024 7.118 33.515 4.745 9.639 11.27 17.054 19.723 22.393 8.453 5.338 18.24 8.008 29.362 8.008s20.91-2.67 29.363-8.008c8.453-5.339 14.978-12.754 19.723-22.393 4.745-9.639 7.118-20.761 7.118-33.515 0-12.753-2.373-24.172-7.118-33.811s-11.27-17.054-19.723-22.393Zm3.707 79.19c-2.669 7.118-6.673 12.753-12.16 17.202-5.487 4.301-12.457 6.525-20.91 6.525s-15.422-2.224-20.909-6.525c-5.487-4.3-9.491-10.084-12.16-17.202-2.67-7.118-4.004-14.829-4.004-22.986 0-8.156 1.334-16.016 4.004-23.134 2.669-7.118 6.673-12.901 12.16-17.35 5.487-4.45 12.456-6.674 20.909-6.674s15.423 2.225 20.91 6.674 9.491 10.232 12.16 17.35c2.67 7.118 4.004 14.83 4.004 23.134 0 8.305-1.334 16.016-4.004 22.986ZM678.123 84.645c-6.229-3.411-13.644-5.042-21.948-5.042-9.343 0-16.906 1.928-22.838 5.783-5.931 3.856-10.38 8.898-13.198 15.275h-1.631V81.234h-18.389v123.678h18.982v-74.444c0-7.266 1.335-13.347 4.152-18.389 2.669-5.042 6.525-8.897 11.271-11.567 4.745-2.669 10.084-4.004 16.164-4.004 8.749 0 15.719 2.67 20.761 8.157s7.563 13.05 7.563 22.837v77.41h18.982v-78.596c0-10.529-1.78-19.279-5.19-26.1-3.559-6.97-8.305-12.012-14.681-15.423v-.148ZM806.101 188.155h1.038v16.757h18.982V123.35c0-9.788-1.631-17.647-4.894-23.58-3.262-5.93-7.266-10.231-12.16-13.197-4.894-2.966-9.936-4.894-15.126-5.784-5.19-.89-9.787-1.483-13.791-1.483-6.229 0-12.606.89-18.982 2.521-6.377 1.632-12.309 4.597-17.647 8.898-5.339 4.152-9.788 10.084-12.902 17.647l18.092 6.377c2.076-4.449 5.783-8.75 10.826-12.754 5.19-4.004 12.308-5.931 21.354-5.931s15.275 2.224 19.575 6.673c4.301 4.449 6.525 10.529 6.525 18.537v.593c0 3.114-1.038 5.19-3.262 6.377-2.225 1.186-5.636 2.076-10.381 2.669-4.746.445-10.826 1.186-18.389 2.224-5.783.742-11.418 1.78-17.202 2.966-5.635 1.335-10.826 3.114-15.571 5.635-4.745 2.522-8.453 5.932-11.27 10.381-2.818 4.449-4.153 10.233-4.153 17.351 0 8.008 1.928 14.978 5.635 20.613 3.708 5.635 8.898 9.936 15.275 12.901 6.377 2.966 13.495 4.449 21.354 4.449 7.267 0 13.347-1.038 18.241-3.262 5.042-2.076 9.046-4.746 12.012-7.86 2.966-3.114 5.19-5.932 6.376-8.601l.445.445Zm-14.829-1.928c-5.191 2.966-11.567 4.449-19.13 4.449-7.563 0-13.792-1.631-18.686-5.042-4.893-3.411-7.414-8.305-7.414-14.978 0-4.894 1.334-8.601 3.855-11.419 2.67-2.817 6.08-4.893 10.381-6.376 4.301-1.483 8.898-2.521 13.792-3.115 2.076-.296 4.745-.593 8.007-1.038 3.263-.445 6.674-.889 10.233-1.483 3.559-.593 6.673-1.186 9.342-2.076 2.67-.741 4.449-1.631 5.339-2.669v17.35c0 5.191-1.335 10.085-4.004 14.682-2.669 4.745-6.525 8.453-11.715 11.418v.297ZM879.804 39.86h-18.982v165.052h18.982V39.86ZM1001.11 39.86h-20.02v165.052h20.02V39.86ZM1057.46 130.468c0-7.266 1.34-13.347 4.15-18.389 2.67-5.042 6.53-8.897 11.27-11.567 4.75-2.669 10.09-4.004 16.17-4.004 8.75 0 15.72 2.67 20.76 8.157 5.04 5.487 7.56 13.05 7.56 22.837v77.41h18.98v-78.596c0-10.529-1.77-19.279-5.19-26.1-3.55-6.97-8.3-12.012-14.68-15.423-6.23-3.41-13.64-5.042-21.94-5.042-9.35 0-16.91 1.928-22.84 5.784-5.93 3.855-10.38 8.897-13.2 15.274h-1.63V81.382h-18.39v123.53h18.98v-74.444ZM1253.06 149.153c-5.48-5.487-13.64-9.639-24.76-12.308l-18.39-4.449c-7.27-1.78-12.75-4.152-16.16-6.822-3.42-2.669-5.2-6.525-5.2-11.27 0-5.339 2.53-9.788 7.57-13.198 5.04-3.411 11.27-5.19 18.83-5.19 5.49 0 10.09.889 13.64 2.669 3.56 1.779 6.38 4.004 8.46 6.673 2.07 2.669 3.7 5.487 4.74 8.304l17.06-4.893c-2.97-8.75-7.86-15.868-14.98-21.355-6.97-5.338-16.61-8.008-28.92-8.008-8.75 0-16.46 1.483-23.28 4.597-6.82 3.114-12.31 7.267-16.17 12.605-3.85 5.339-5.93 11.567-5.93 18.537 0 8.601 2.67 15.72 8.01 21.355s13.64 9.787 24.91 12.457l20.62 4.893c6.23 1.483 10.82 3.708 13.79 6.525 2.96 2.966 4.45 6.525 4.45 10.826 0 5.339-2.67 9.936-7.86 13.643-5.19 3.707-12.31 5.635-21.21 5.635-7.86 0-14.09-1.631-18.83-5.042-4.75-3.41-8.01-8.304-9.79-14.978l-18.09 4.449c2.22 10.529 7.41 18.537 15.72 24.024 8.3 5.487 18.68 8.156 31.29 8.156 9.64 0 18.09-1.631 25.36-4.893 7.26-3.263 12.9-7.712 16.9-13.199 4.01-5.635 6.08-11.863 6.08-18.981 0-8.602-2.67-15.72-8.15-21.207l.29.445ZM1298.29 174.66c0 7.266 1.63 13.198 5.05 17.944 3.41 4.745 7.56 8.304 12.75 10.529 5.19 2.224 10.38 3.411 15.72 3.411 3.56 0 6.52-.297 8.75-.742 2.22-.445 4.15-1.038 5.34-1.483l-3.86-17.054c-.74.148-1.93.297-3.26.593-1.34.297-3.12.297-5.19.297-2.82 0-5.49-.445-7.86-1.335-2.52-.89-4.6-2.669-6.08-5.338-1.63-2.67-2.38-6.674-2.38-12.012V97.25h26.4V81.086h-26.4v-29.66h-18.98v29.66h-18.68V97.25h18.68v77.41ZM1382.08 34.67c-3.71 0-6.82 1.334-9.49 3.855s-4 5.635-4 9.046c0 3.41 1.33 6.525 4 9.046 2.67 2.521 5.78 3.856 9.49 3.856s6.82-1.187 9.49-3.856c2.67-2.67 4-5.635 4-9.046 0-3.41-1.33-6.525-4-9.046-2.67-2.521-5.78-3.856-9.49-3.856ZM1391.42 81.086h-18.98v123.826h18.98V81.086ZM1434.72 174.66c0 7.266 1.64 13.198 5.05 17.944 3.41 4.745 7.56 8.304 12.75 10.529 5.19 2.224 10.38 3.411 15.72 3.411 3.56 0 6.52-.297 8.75-.742 2.22-.445 4.15-1.038 5.34-1.483l-3.86-17.054c-.74.148-1.93.297-3.26.593-1.34.297-3.11.297-5.19.297-2.82 0-5.49-.445-7.86-1.335-2.52-.89-4.6-2.669-6.08-5.338-1.63-2.67-2.37-6.674-2.37-12.012V97.25h26.39V81.086h-26.39v-29.66h-18.99v29.66h-18.68V97.25h18.68v77.41ZM1585.54 184.003h1.34v20.909h18.98V81.086h-18.98v73.258c0 7.711-1.64 14.088-5.05 19.13s-7.56 8.749-12.45 11.122c-4.9 2.373-9.79 3.707-14.54 3.707-7.86 0-14.38-2.669-19.42-8.008-5.04-5.338-7.57-12.605-7.57-21.651V81.086h-18.98v78.596c0 10.529 1.78 19.279 5.19 26.1 3.41 6.97 8.16 12.012 14.24 15.423 6.08 3.411 12.9 5.19 20.61 5.19 9.34 0 17.06-2.224 23.28-6.525 6.08-4.3 10.68-9.787 13.5-16.016l-.15.149ZM1649.01 174.66c0 7.266 1.63 13.198 5.04 17.944 3.41 4.745 7.57 8.304 12.76 10.529 5.19 2.224 10.38 3.411 15.72 3.411 3.56 0 6.52-.297 8.75-.742 2.22-.445 4.15-1.038 5.33-1.483l-3.85-17.054c-.74.148-1.93.297-3.26.593-1.34.297-3.12.297-5.19.297-2.82 0-5.49-.445-7.86-1.335-2.52-.89-4.6-2.669-6.08-5.338-1.64-2.67-2.38-6.674-2.38-12.012V97.25h26.4V81.086h-26.4v-29.66h-18.98v29.66h-18.68V97.25h18.68v77.41ZM1808.13 93.246c-5.19-4.745-10.82-8.305-17.2-10.38-6.38-2.077-12.6-3.263-19.13-3.263-11.12 0-20.91 2.67-29.21 8.156-8.31 5.487-14.83 13.05-19.58 22.689-4.74 9.639-6.97 20.91-6.97 33.515s2.37 23.727 6.97 33.366c4.6 9.64 11.27 16.906 19.87 22.245 8.6 5.338 18.84 7.859 30.85 7.859 8.3 0 15.87-1.334 22.69-3.855 6.67-2.67 12.31-6.229 16.9-10.974 4.6-4.746 7.86-10.233 9.79-16.461l-18.39-5.19c-1.63 4.3-3.85 7.859-6.82 10.825-2.97 2.966-6.53 5.042-10.53 6.377-4 1.483-8.6 2.076-13.64 2.076-7.71 0-14.39-1.631-20.17-5.042-5.78-3.411-10.38-8.305-13.64-14.681-2.97-5.784-4.3-13.05-4.6-21.206h89.72v-8.008c0-11.567-1.48-21.355-4.6-29.215-3.11-7.859-7.12-14.236-12.31-19.13v.297Zm-72.66 39.891c.29-5.783 1.63-11.122 4.15-16.312 2.97-5.932 7.12-10.826 12.75-14.533 5.49-3.707 12.02-5.635 19.58-5.635 6.82 0 12.9 1.631 17.94 4.745 5.04 3.114 9.05 7.563 11.72 13.05 2.81 5.487 4.15 11.715 4.15 18.685h-70.29ZM1973.04 97.25V81.086h-27.73V68.48c0-6.08 1.33-10.826 4.15-13.94 2.82-3.114 7.26-4.746 13.64-4.746 2.67 0 4.89.297 6.67.742 1.78.445 2.97.89 4.01 1.186l5.49-16.46c-1.49-.594-3.71-1.335-6.68-2.077-2.96-.741-6.82-1.186-11.42-1.186-5.93 0-11.56 1.186-16.9 3.56-5.34 2.372-9.64 5.93-13.05 10.676-3.26 4.746-5.04 10.678-5.04 17.796v17.054h-20.02V97.25h20.02v107.662h18.98V97.25h27.88ZM2094.05 177.181c4.74-9.639 7.11-20.761 7.11-33.515 0-12.753-2.37-24.172-7.11-33.811-4.75-9.639-11.27-17.054-19.73-22.393-8.45-5.338-18.24-8.008-29.36-8.008-11.12 0-20.91 2.67-29.36 8.008-8.46 5.34-14.98 12.754-19.73 22.393-4.74 9.639-7.11 20.91-7.11 33.811 0 12.902 2.37 24.024 7.11 33.515 4.75 9.639 11.27 17.054 19.73 22.393 8.45 5.338 18.24 8.008 29.36 8.008 11.12 0 20.91-2.67 29.36-8.008 8.46-5.339 14.98-12.754 19.73-22.393Zm-15.87-10.529c-2.67 7.118-6.68 12.753-12.16 17.202-5.49 4.301-12.46 6.525-20.91 6.525s-15.42-2.224-20.91-6.525c-5.49-4.3-9.49-10.084-12.16-17.202-2.67-7.118-4.01-14.829-4.01-22.986 0-8.156 1.34-16.016 4.01-23.134 2.67-7.118 6.67-12.901 12.16-17.35 5.49-4.45 12.46-6.674 20.91-6.674s15.42 2.225 20.91 6.674c5.48 4.449 9.49 10.232 12.16 17.35 2.67 7.118 4 14.83 4 23.134 0 8.305-1.33 16.016-4 22.986ZM2181.98 79.158c-7.41 0-14.08 1.928-20.02 5.783-5.93 3.856-9.93 8.75-12.3 14.978h-1.34V81.234h-18.39v123.678h18.98v-78.3c0-5.635 1.34-10.529 4.01-14.977 2.67-4.301 6.38-7.86 11.12-10.381 4.75-2.521 10.09-3.708 16.02-3.708 2.52 0 4.89.149 7.26.594 2.38.445 3.71.593 4.45.741V79.603c-1.04 0-2.67-.148-4.74-.297h-5.19l.14-.148ZM139.959 385.684h-87.94v-73.406H32v165.053h20.02V403.48h87.939v73.851h20.02V312.278h-20.02v73.406ZM283.657 365.516c-5.19-4.745-10.826-8.304-17.202-10.381-6.377-2.076-12.605-3.262-19.13-3.262-11.122 0-20.91 2.669-29.214 8.156-8.305 5.487-14.83 13.05-19.575 22.689-4.746 9.639-6.97 20.91-6.97 33.515s2.372 23.727 6.97 33.366c4.597 9.64 11.27 16.906 19.871 22.245 8.601 5.338 18.834 7.859 30.846 7.859 8.304 0 15.867-1.334 22.689-3.855 6.673-2.67 12.308-6.229 16.905-10.974 4.598-4.746 7.86-10.233 9.788-16.461l-18.389-5.19c-1.631 4.3-3.855 7.859-6.821 10.825-2.966 2.966-6.525 5.042-10.529 6.377-4.004 1.483-8.601 2.076-13.643 2.076-7.712 0-14.385-1.631-20.169-5.042-5.783-3.411-10.38-8.304-13.643-14.681-2.966-5.784-4.3-13.05-4.597-21.206h89.719v-8.008c0-11.567-1.483-21.355-4.597-29.214-3.115-7.86-7.119-14.237-12.309-19.131v.297Zm-72.665 39.891c.297-5.783 1.632-11.122 4.153-16.312 2.966-5.932 7.118-10.826 12.753-14.533 5.487-3.707 12.012-5.635 19.575-5.635 6.822 0 12.902 1.631 17.944 4.745s9.046 7.563 11.715 13.05c2.818 5.487 4.152 11.716 4.152 18.685h-70.292ZM405.704 359.139c-4.894-2.966-9.936-4.893-15.126-5.783-5.19-.89-9.788-1.483-13.792-1.483-6.228 0-12.605.89-18.981 2.521-6.377 1.631-12.309 4.597-17.647 8.898-5.339 4.152-9.788 10.084-12.902 17.647l18.092 6.376c2.076-4.448 5.783-8.749 10.825-12.753 5.191-4.004 12.309-5.932 21.355-5.932 9.046 0 15.274 2.225 19.575 6.674 4.301 4.448 6.525 10.528 6.525 18.536v.594c0 3.114-1.038 5.19-3.263 6.376-2.224 1.187-5.635 2.076-10.38 2.67-4.746.445-10.826 1.186-18.389 2.224-5.783.742-11.419 1.78-17.202 2.966-5.635 1.335-10.826 3.114-15.571 5.635-4.746 2.521-8.453 5.932-11.271 10.381-2.817 4.449-4.152 10.232-4.152 17.35 0 8.008 1.928 14.978 5.635 20.613 3.708 5.636 8.898 9.936 15.275 12.902 6.376 2.966 13.495 4.449 21.354 4.449 7.267 0 13.347-1.038 18.241-3.263 5.042-2.076 9.046-4.745 12.012-7.859 2.965-3.114 5.19-5.932 6.376-8.601h1.038v16.757h18.982v-81.562c0-9.788-1.631-17.647-4.894-23.579-3.262-5.932-7.266-10.233-12.16-13.199l.445.445Zm-2.076 73.406c0 5.191-1.335 10.085-4.004 14.682-2.669 4.745-6.525 8.453-11.715 11.418-5.191 2.966-11.567 4.449-19.13 4.449-7.564 0-13.792-1.631-18.686-5.042-4.893-3.411-7.414-8.304-7.414-14.978 0-4.893 1.334-8.601 3.855-11.418 2.67-2.818 6.08-4.894 10.381-6.377 4.301-1.483 8.898-2.521 13.791-3.114 2.077-.297 4.746-.593 8.008-1.038 3.263-.445 6.674-.89 10.233-1.483 3.559-.593 6.673-1.187 9.342-2.076 2.67-.742 4.449-1.632 5.339-2.67v17.647ZM476.441 312.278h-18.982v165.053h18.982V312.278ZM560.376 460.128c-1.335.297-3.114.297-5.19.297-2.818 0-5.487-.445-7.86-1.335-2.521-.889-4.597-2.669-6.08-5.338-1.631-2.67-2.373-6.674-2.373-12.012v-72.22h26.397v-16.164h-26.397v-29.659h-18.982v29.659h-18.685v16.164h18.685v77.41c0 7.267 1.632 13.198 5.043 17.944 3.41 4.745 7.563 8.304 12.753 10.529 5.19 2.224 10.381 3.411 15.719 3.411 3.559 0 6.525-.297 8.75-.742 2.224-.445 4.152-1.038 5.338-1.483l-3.855-17.054c-.742.149-1.928.297-3.263.593ZM675.75 356.915c-6.377-3.411-13.792-5.042-22.096-5.042-9.788 0-17.499 1.928-23.283 5.635-5.783 3.856-10.232 8.898-13.05 15.274h-1.631V312.13h-18.982v165.052h18.982v-74.444c0-7.266 1.483-13.346 4.301-18.388 2.817-5.042 6.673-8.898 11.567-11.568 4.894-2.669 10.529-4.003 16.757-4.003 8.898 0 16.016 2.669 21.058 8.156 5.042 5.487 7.563 13.05 7.563 22.837v77.41h18.982v-78.596c0-10.677-1.78-19.427-5.339-26.248-3.559-6.822-8.453-12.012-14.829-15.423ZM870.61 359.139c-4.894-2.966-9.936-4.893-15.126-5.783-5.191-.89-9.788-1.483-13.792-1.483-6.228 0-12.605.89-18.982 2.521-6.376 1.631-12.308 4.597-17.647 8.898-5.338 4.152-9.787 10.084-12.902 17.647l18.092 6.376c2.077-4.448 5.784-8.749 10.826-12.753 5.191-4.004 12.308-5.932 21.355-5.932 9.046 0 15.274 2.225 19.575 6.674 4.3 4.448 6.525 10.528 6.525 18.536v.594c0 3.114-1.038 5.19-3.263 6.376-2.224 1.187-5.635 2.076-10.381 2.67-4.745.445-10.825 1.186-18.388 2.224-5.784.742-11.419 1.78-17.203 2.966-5.635 1.335-10.825 3.114-15.57 5.635-4.746 2.521-8.453 5.932-11.271 10.381-2.818 4.449-4.152 10.232-4.152 17.35 0 8.008 1.928 14.978 5.635 20.613 3.707 5.636 8.898 9.936 15.275 12.902 6.376 2.966 13.494 4.449 21.354 4.449 7.267 0 13.347-1.038 18.24-3.263 5.042-2.076 9.046-4.745 12.012-7.859 2.966-3.114 5.191-5.932 6.377-8.601h1.038v16.757h18.982v-81.562c0-9.788-1.632-17.647-4.894-23.579-3.263-5.932-7.266-10.233-12.16-13.199l.445.445Zm-2.076 73.406c0 5.191-1.335 10.085-4.004 14.682-2.67 4.745-6.525 8.453-11.716 11.418-5.19 2.966-11.567 4.449-19.13 4.449-7.563 0-13.791-1.631-18.685-5.042-4.894-3.411-7.415-8.304-7.415-14.978 0-4.893 1.335-8.601 3.856-11.418 2.669-2.818 6.08-4.894 10.38-6.377 4.301-1.483 8.898-2.521 13.792-3.114 2.076-.297 4.745-.593 8.008-1.038 3.262-.445 6.673-.89 10.232-1.483 3.559-.593 6.674-1.187 9.343-2.076 2.669-.742 4.449-1.632 5.339-2.67v17.647ZM1000.52 357.063c-6.232-3.411-13.647-5.042-21.951-5.042-9.343 0-16.906 1.928-22.838 5.784-5.932 3.855-10.381 8.897-13.198 15.274h-1.631v-19.427h-18.389v123.827h18.982v-74.444c0-7.267 1.334-13.347 4.152-18.389 2.669-5.042 6.525-8.898 11.27-11.567 4.746-2.669 10.085-4.004 16.165-4.004 8.749 0 15.719 2.669 20.761 8.156s7.567 13.05 7.567 22.838v77.41h18.98v-78.597c0-10.528-1.78-19.278-5.19-26.1-3.56-6.969-8.31-12.011-14.68-15.422v-.297ZM1139.77 373.227h-1.64c-1.33-2.076-3.41-4.893-5.78-8.304-2.52-3.411-6.08-6.377-10.82-9.046-4.75-2.669-11.13-4.004-19.13-4.004-10.39 0-19.58 2.669-27.59 7.86-8.01 5.19-14.09 12.605-18.68 22.096-4.6 9.49-6.68 20.909-6.68 33.811 0 12.902 2.23 24.469 6.68 34.108 4.45 9.639 10.67 17.054 18.53 22.244 7.86 5.19 17.06 7.86 27.29 7.86 8.01 0 14.38-1.335 19.13-4.004 4.75-2.67 8.45-5.636 10.97-9.046 2.53-3.411 4.6-6.229 5.94-8.453h2.22v18.982h18.39V312.278h-18.98v60.949h.15Zm-3.86 66.882c-2.67 7.118-6.67 12.605-12.01 16.609-5.34 4.004-11.72 5.931-19.43 5.931-7.71 0-14.53-2.076-19.87-6.376-5.34-4.153-9.34-9.936-12.01-17.054-2.67-7.118-4.01-15.126-4.01-24.024 0-8.898 1.34-16.609 4.01-23.579 2.67-6.97 6.67-12.605 12.01-16.609 5.34-4.152 12.01-6.228 20.17-6.228 8.15 0 14.23 1.927 19.57 5.783 5.34 3.856 9.2 9.343 11.87 16.313 2.67 6.969 4 15.126 4 24.32s-1.33 17.647-4.15 24.765l-.15.149ZM1301.85 336.302c8.01-5.042 17.2-7.563 27.14-7.563 5.49 0 10.68.741 15.72 2.224 5.04 1.483 9.64 3.708 13.79 6.674 4.15 2.965 7.71 6.673 10.68 10.973 2.96 4.301 5.04 9.343 6.23 15.127h20.02c-1.49-8.453-4.3-16.016-8.16-22.69-4-6.673-8.9-12.308-14.83-16.905-5.93-4.597-12.6-8.157-19.87-10.678-7.27-2.372-15.13-3.559-23.43-3.559-14.09 0-26.55 3.411-37.52 10.381-10.97 6.822-19.58 16.609-25.8 29.362-6.23 12.754-9.49 27.732-9.49 45.082 0 17.351 3.11 32.477 9.49 45.082 6.37 12.605 14.97 22.393 25.8 29.362 10.97 6.822 23.43 10.381 37.52 10.381 8.3 0 16.16-1.186 23.43-3.559a65.5 65.5 0 0 0 19.87-10.529c5.93-4.597 10.83-10.232 14.83-16.906 4-6.673 6.67-14.236 8.16-22.689h-20.02c-1.19 5.635-3.27 10.677-6.23 15.126-2.97 4.449-6.53 8.008-10.68 10.974-4.15 2.966-8.75 5.191-13.79 6.673-5.04 1.483-10.38 2.225-15.72 2.225-9.94 0-18.98-2.521-27.14-7.563-8.15-5.042-14.53-12.457-19.28-22.393-4.74-9.936-7.11-21.947-7.11-36.184 0-14.236 2.37-26.396 7.11-36.184 4.75-9.787 11.13-17.202 19.28-22.392v.148ZM1501.16 359.139c-4.89-2.966-9.93-4.893-15.12-5.783-5.2-.89-9.79-1.483-13.8-1.483-6.22 0-12.6.89-18.98 2.521-6.37 1.631-12.31 4.597-17.65 8.898-5.33 4.152-9.78 10.084-12.9 17.647l18.09 6.376c2.08-4.448 5.79-8.749 10.83-12.753 5.19-4.004 12.31-5.932 21.36-5.932 9.04 0 15.27 2.225 19.57 6.674 4.3 4.448 6.53 10.528 6.53 18.536v.594c0 3.114-1.04 5.19-3.27 6.376-2.22 1.187-5.63 2.076-10.38 2.67-4.74.445-10.82 1.186-18.39 2.224-5.78.742-11.42 1.78-17.2 2.966-5.63 1.335-10.82 3.114-15.57 5.635s-8.45 5.932-11.27 10.381c-2.82 4.449-4.15 10.232-4.15 17.35 0 8.008 1.93 14.978 5.63 20.613 3.71 5.636 8.9 9.936 15.28 12.902 6.37 2.966 13.49 4.449 21.35 4.449 7.27 0 13.35-1.038 18.24-3.263 5.04-2.076 9.05-4.745 12.01-7.859 2.97-3.114 5.19-5.932 6.38-8.601h1.04v16.757h18.98v-81.562c0-9.788-1.63-17.647-4.89-23.579-3.27-5.932-7.27-10.233-12.16-13.199l.44.445Zm-2.07 73.406c0 5.191-1.34 10.085-4.01 14.682-2.67 4.745-6.52 8.453-11.71 11.418-5.19 2.966-11.57 4.449-19.13 4.449-7.57 0-13.8-1.631-18.69-5.042-4.89-3.411-7.41-8.304-7.41-14.978 0-4.893 1.33-8.601 3.85-11.418 2.67-2.818 6.08-4.894 10.38-6.377 4.3-1.483 8.9-2.521 13.79-3.114 2.08-.297 4.75-.593 8.01-1.038 3.26-.445 6.67-.89 10.23-1.483 3.56-.593 6.68-1.187 9.35-2.076 2.67-.742 4.45-1.632 5.34-2.67v17.647ZM1604.97 351.576c-7.42 0-14.09 1.928-20.02 5.784-5.93 3.855-9.94 8.749-12.31 14.978h-1.34v-18.686h-18.38v123.827h18.98v-78.3c0-5.635 1.33-10.529 4-14.978 2.67-4.3 6.38-7.859 11.12-10.38 4.75-2.521 10.09-3.708 16.02-3.708 2.52 0 4.89.148 7.27.593 2.37.445 3.7.594 4.45.742v-19.279c-1.04 0-2.67-.148-4.75-.296h-5.19l.15-.297ZM1719.9 365.516c-5.19-4.745-10.83-8.304-17.21-10.381-6.37-2.076-12.6-3.262-19.13-3.262-11.12 0-20.91 2.669-29.21 8.156s-14.83 13.05-19.57 22.689c-4.75 9.639-6.97 20.91-6.97 33.515s2.37 23.727 6.97 33.366c4.59 9.64 11.27 16.906 19.87 22.245 8.6 5.338 18.83 7.859 30.84 7.859 8.31 0 15.87-1.334 22.69-3.855 6.67-2.67 12.31-6.229 16.91-10.974 4.59-4.746 7.86-10.233 9.78-16.461l-18.38-5.19c-1.64 4.3-3.86 7.859-6.83 10.825-2.96 2.966-6.52 5.042-10.52 6.377-4.01 1.483-8.61 2.076-13.65 2.076-7.71 0-14.38-1.631-20.17-5.042-5.78-3.411-10.38-8.304-13.64-14.681-2.97-5.784-4.3-13.05-4.6-21.206h89.72v-8.008c0-11.567-1.48-21.355-4.59-29.214-3.12-7.86-7.12-14.237-12.31-19.131v.297Zm-72.67 39.891c.3-5.783 1.63-11.122 4.15-16.312 2.97-5.932 7.12-10.826 12.76-14.533 5.48-3.707 12.01-5.635 19.57-5.635 6.82 0 12.9 1.631 17.95 4.745 5.04 3.114 9.04 7.563 11.71 13.05 2.82 5.487 4.15 11.716 4.15 18.685h-70.29ZM1852.18 403.48h74.44v-17.796h-74.44v-55.759h79.63v-17.647h-99.65v165.053h100.99v-17.796h-80.97V403.48ZM2038.88 353.504l-29.66 50.569-29.66-50.569h-21.95l39.3 61.839-39.3 61.988h21.95l29.66-48.048 29.66 48.048h21.95l-40.04-61.988 40.04-61.839h-21.95ZM2113.47 374.71c5.49-3.855 12.01-5.783 19.43-5.783 8.45 0 15.13 2.224 20.02 6.525 5.04 4.449 8.16 9.342 9.64 14.978h18.98c-1.04-7.712-3.86-14.533-8.3-20.317-4.45-5.783-10.24-10.38-17.21-13.495-6.97-3.262-14.83-4.893-23.58-4.893-11.12 0-20.91 2.669-29.21 8.156s-14.83 13.05-19.57 22.689c-4.6 9.639-6.97 20.761-6.97 33.366 0 12.606 2.22 23.283 6.82 32.922 4.45 9.639 10.97 17.202 19.27 22.689 8.31 5.487 18.39 8.156 29.96 8.156 9.2 0 17.2-1.779 24.02-5.19 6.97-3.411 12.46-8.008 16.61-13.791 4.16-5.784 6.83-12.457 8.01-19.724h-18.98c-1.19 4.449-3.11 8.305-5.93 11.567-2.82 3.263-6.23 5.636-10.23 7.415-4.01 1.78-8.46 2.521-13.5 2.521-7.56 0-14.09-1.928-19.57-5.932-5.64-3.855-9.79-9.491-12.91-16.46-2.96-7.119-4.59-15.423-4.59-25.062 0-9.64 1.48-17.499 4.59-24.469 3.12-6.97 7.42-12.309 13.05-16.164l.15.296ZM2295.73 365.516c-5.19-4.745-10.83-8.304-17.21-10.381-6.37-2.076-12.6-3.262-19.13-3.262-11.12 0-20.9 2.669-29.21 8.156-8.3 5.487-14.83 13.05-19.57 22.689-4.75 9.639-6.97 20.91-6.97 33.515s2.37 23.727 6.97 33.366c4.59 9.64 11.27 16.906 19.87 22.245 8.6 5.338 18.83 7.859 30.84 7.859 8.31 0 15.87-1.334 22.69-3.855 6.68-2.67 12.31-6.229 16.91-10.974 4.59-4.746 7.86-10.233 9.79-16.461l-18.39-5.19c-1.63 4.3-3.86 7.859-6.83 10.825-2.96 2.966-6.52 5.042-10.52 6.377-4.01 1.483-8.61 2.076-13.65 2.076-7.71 0-14.38-1.631-20.17-5.042-5.78-3.411-10.38-8.304-13.64-14.681-2.96-5.784-4.3-13.05-4.6-21.206h89.72v-8.008c0-11.567-1.48-21.355-4.59-29.214-3.12-7.86-7.12-14.237-12.31-19.131v.297Zm-72.67 39.891c.3-5.783 1.63-11.122 4.15-16.312 2.97-5.932 7.12-10.826 12.76-14.533 5.49-3.707 12.01-5.635 19.57-5.635 6.82 0 12.9 1.631 17.95 4.745 5.04 3.114 9.04 7.563 11.71 13.05 2.82 5.487 4.15 11.716 4.15 18.685h-70.29ZM2360.53 312.278h-18.98v165.053h18.98V312.278ZM2414.36 312.278h-18.98v165.053h18.98V312.278ZM2535.52 365.516c-5.19-4.745-10.82-8.304-17.2-10.381-6.38-2.076-12.61-3.262-19.13-3.262-11.12 0-20.91 2.669-29.22 8.156-8.3 5.487-14.83 13.05-19.57 22.689-4.75 9.639-6.97 20.91-6.97 33.515s2.37 23.727 6.97 33.366c4.6 9.64 11.27 16.906 19.87 22.245 8.6 5.338 18.83 7.859 30.85 7.859 8.3 0 15.86-1.334 22.69-3.855 6.67-2.67 12.3-6.229 16.9-10.974 4.6-4.746 7.86-10.233 9.79-16.461l-18.39-5.19c-1.63 4.3-3.86 7.859-6.82 10.825-2.97 2.966-6.53 5.042-10.53 6.377-4 1.483-8.6 2.076-13.64 2.076-7.72 0-14.39-1.631-20.17-5.042-5.79-3.411-10.38-8.304-13.65-14.681-2.96-5.784-4.3-13.05-4.59-21.206h89.72v-8.008c0-11.567-1.49-21.355-4.6-29.214-3.12-7.86-7.12-14.237-12.31-19.131v.297Zm-72.66 39.891c.29-5.783 1.63-11.122 4.15-16.312 2.96-5.932 7.12-10.826 12.75-14.533 5.49-3.707 12.01-5.635 19.58-5.635 6.82 0 12.9 1.631 17.94 4.745 5.04 3.114 9.05 7.563 11.72 13.05 2.81 5.487 4.15 11.716 4.15 18.685h-70.29ZM2659.5 357.063c-6.23-3.411-13.65-5.042-21.95-5.042-9.34 0-16.91 1.928-22.84 5.784-5.93 3.855-10.38 8.897-13.2 15.274h-1.63v-19.427h-18.39v123.827h18.98v-74.444c0-7.267 1.34-13.347 4.16-18.389 2.67-5.042 6.52-8.898 11.27-11.567 4.74-2.669 10.08-4.004 16.16-4.004 8.75 0 15.72 2.669 20.76 8.156 5.04 5.487 7.57 13.05 7.57 22.838v77.41h18.98v-78.597c0-10.528-1.78-19.278-5.19-26.1-3.56-6.969-8.31-12.011-14.68-15.422v-.297ZM2745.06 374.71c5.49-3.855 12.01-5.783 19.43-5.783 8.45 0 15.12 2.224 20.02 6.525 5.04 4.449 8.15 9.342 9.64 14.978h18.98c-1.04-7.712-3.86-14.533-8.31-20.317-4.44-5.783-10.23-10.38-17.2-13.495-6.97-3.262-14.83-4.893-23.58-4.893-11.12 0-20.91 2.669-29.21 8.156s-14.83 13.05-19.58 22.689c-4.59 9.639-6.97 20.761-6.97 33.366 0 12.606 2.23 23.283 6.83 32.922 4.44 9.639 10.97 17.202 19.27 22.689 8.31 5.487 18.39 8.156 29.96 8.156 9.19 0 17.2-1.779 24.02-5.19 6.97-3.411 12.46-8.008 16.61-13.791 4.16-5.784 6.82-12.457 8.01-19.724H2794c-1.19 4.449-3.11 8.305-5.93 11.567-2.82 3.263-6.23 5.636-10.23 7.415-4.01 1.78-8.46 2.521-13.5 2.521-7.56 0-14.09-1.928-19.57-5.932-5.64-3.855-9.79-9.491-12.91-16.46-2.96-7.119-4.59-15.423-4.59-25.062 0-9.64 1.48-17.499 4.59-24.469 3.12-6.97 7.42-12.309 13.05-16.164l.15.296ZM2944.07 413.86c0-11.567-1.48-21.354-4.59-29.214-3.12-7.86-7.12-14.236-12.31-19.13-5.19-4.745-10.83-8.304-17.2-10.381-6.38-2.076-12.61-3.262-19.13-3.262-11.13 0-20.91 2.669-29.22 8.156-8.3 5.487-14.83 13.05-19.57 22.689-4.75 9.639-6.97 20.91-6.97 33.515s2.37 23.727 6.97 33.366c4.59 9.64 11.27 16.906 19.87 22.245 8.6 5.338 18.83 7.859 30.84 7.859 8.31 0 15.87-1.334 22.69-3.855 6.68-2.67 12.31-6.229 16.91-10.974 4.6-4.746 7.86-10.233 9.79-16.461l-18.39-5.19c-1.63 4.3-3.86 7.859-6.82 10.825-2.97 2.966-6.53 5.042-10.53 6.377-4.01 1.483-8.6 2.076-13.65 2.076-7.71 0-14.38-1.631-20.16-5.042-5.79-3.411-10.38-8.304-13.65-14.681-2.96-5.784-4.3-13.05-4.59-21.206h89.71v-8.008.296Zm-89.57-8.453c.3-5.783 1.64-11.122 4.16-16.312 2.96-5.932 7.11-10.826 12.75-14.533 5.49-3.707 12.01-5.635 19.57-5.635 6.83 0 12.91 1.631 17.95 4.745 5.04 3.114 9.04 7.563 11.71 13.05 2.82 5.487 4.16 11.716 4.16 18.685h-70.3Z"
			fill="currentColor"
		/>
	</svg>
);
export default SvgLogoName;
