<template><svg aria-hidden="true" :fill="color" xmlns="http://www.w3.org/2000/svg" viewBox="0 0 48 48" width="48px" height="48px"><path fill-rule="evenodd" d="M20 7.5a4.5 4.5 0 0 0-4.5 4.5v12c0 .506-.25.953-.633 1.224a8.5 8.5 0 1 0 10.267 0A1.5 1.5 0 0 1 24.5 24V12A4.5 4.5 0 0 0 20 7.5M31.5 32c0-3.487-1.553-6.61-4-8.718V12a7.5 7.5 0 0 0-15 0v11.282A11.48 11.48 0 0 0 8.5 32c0 6.351 5.149 11.5 11.5 11.5S31.5 38.351 31.5 32M33 8a1 1 0 1 0 0 2h6a1 1 0 1 0 0-2zm-1 8a1 1 0 0 1 1-1h6a1 1 0 1 1 0 2h-6a1 1 0 0 1-1-1m1 6a1 1 0 1 0 0 2h6a1 1 0 1 0 0-2zm-11.5 4.707V16h-3v10.707a5.5 5.5 0 1 0 3 0"/></svg></template>
<script setup lang="ts">
/**
 * Temperature48 is an SVG icon wrapped in a Vue component to make it easier to use.
 */
withDefaults(
  defineProps<{
    /**
     * Define the color of the icon.
     */
    color?: string;
  }>(),
  {
    color: 'currentColor',
  },
);
</script>
