<template><svg aria-hidden="true" :fill="color" xmlns="http://www.w3.org/2000/svg" viewBox="0 0 64 64" width="64px" height="64px"><path fill-rule="evenodd" d="M32.92 2.816a1.5 1.5 0 0 0-1.84 0l-12 9.333a1.5 1.5 0 0 0 0 2.368l12 9.334a1.5 1.5 0 0 0 1.84 0l12-9.334a1.5 1.5 0 0 0 0-2.368zM32 20.766l-9.557-7.433L32 5.9l9.557 7.433zm-11.08.717a1.5 1.5 0 0 0-1.84 0l-12 9.333A1.5 1.5 0 0 0 7 33.118v5.549a1 1 0 0 0 .386.789l24 18.667a1 1 0 0 0 1.228 0l24-18.667a1 1 0 0 0 .386-.79v-5.548a1.5 1.5 0 0 0-.08-2.302l-12-9.333a1.5 1.5 0 0 0-1.84 0L32 30.1zM55 34.678l-10 7.778v3.5l10-7.778zM33 51.79l10-7.778v3.5l-10 7.778zm-2 0v3.5L21 47.51v-3.5zm-12-9.333v3.5L9 38.177v-3.5zm13 6.31-9.557-7.433L32 33.9l9.557 7.433zM10.443 32 20 39.433 29.557 32 20 24.567zM44 39.433 53.557 32 44 24.567 34.443 32z"/></svg></template>
<script setup lang="ts">
/**
 * Floor64 is an SVG icon wrapped in a Vue component to make it easier to use.
 */
withDefaults(
  defineProps<{
    /**
     * Define the color of the icon.
     */
    color?: string;
  }>(),
  {
    color: 'currentColor',
  },
);
</script>
