<template><svg aria-hidden="true" :fill="color" xmlns="http://www.w3.org/2000/svg" viewBox="0 0 48 48" width="48px" height="48px"><path fill-rule="evenodd" d="M25.5 6a1.5 1.5 0 0 0-3 0v8a1.5 1.5 0 0 0 3 0zm-7.44 12.06a1.5 1.5 0 0 1-2.12 0l-6-6a1.5 1.5 0 0 1 2.12-2.12l6 6a1.5 1.5 0 0 1 0 2.12m20-8.12a1.5 1.5 0 0 1 0 2.12l-6 6a1.5 1.5 0 0 1-2.12-2.12l6-6a1.5 1.5 0 0 1 2.12 0M9.94 38.06a1.5 1.5 0 0 1 0-2.12l6-6a1.5 1.5 0 0 1 2.12 2.12l-6 6a1.5 1.5 0 0 1-2.12 0m22.12-8.12a1.5 1.5 0 0 0-2.12 2.12l6 6a1.5 1.5 0 0 0 2.12-2.12zM25.5 34a1.5 1.5 0 0 0-3 0v8a1.5 1.5 0 0 0 3 0zm7-10a1.5 1.5 0 0 1 1.5-1.5h8a1.5 1.5 0 0 1 0 3h-8a1.5 1.5 0 0 1-1.5-1.5M14 25.5a1.5 1.5 0 0 0 0-3H6a1.5 1.5 0 0 0 0 3zM27 24a3 3 0 1 1-6 0 3 3 0 0 1 6 0"/></svg></template>
<script setup lang="ts">
/**
 * FlashingLight48 is an SVG icon wrapped in a Vue component to make it easier to use.
 */
withDefaults(
  defineProps<{
    /**
     * Define the color of the icon.
     */
    color?: string;
  }>(),
  {
    color: 'currentColor',
  },
);
</script>
