/* eslint-disable */

// @ts-nocheck

import { Switch } from "../../../shared/@patternfly/react-core";
import { Controller, useFormContext } from "react-hook-form";
import { useTranslation } from "react-i18next";

import { FieldProps, FormGroupField } from "./FormGroupField";

type FieldType = "boolean" | "string";

type SwitchFieldProps = FieldProps & {
  fieldType?: FieldType;
  defaultValue?: string | boolean;
};

export const SwitchField = ({
  label,
  field,
  fieldType = "string",
  isReadOnly = false,
  defaultValue,
}: SwitchFieldProps) => {
  const { t } = useTranslation();
  const { control } = useFormContext();
  return (
    <FormGroupField label={label}>
      <Controller
        name={field}
        defaultValue={
          defaultValue ? defaultValue : fieldType === "string" ? "false" : false
        }
        control={control}
        render={({ field }) => (
          <Switch
            id={label}
            label={t("on")}
            labelOff={t("off")}
            isChecked={
              fieldType === "string"
                ? field.value === "true"
                : (field.value as boolean)
            }
            onChange={(_event, value) =>
              field.onChange(fieldType === "string" ? "" + value : value)
            }
            isDisabled={isReadOnly}
            aria-label={label}
          />
        )}
      />
    </FormGroupField>
  );
};
