
    import * as React from 'react';

    import { IconType } from '../types';

    type SiMicrostationProps = React.ComponentPropsWithoutRef<'svg'> & {
      /**
       * The title provides an accessible short text description to the SVG
       */
      title?: string;
      /**
       * Hex color or color name or "default" to use the default hex for each icon
       */
      color?: string;
      /**
       * The size of the Icon.
       */
      size?: string | number;
    }

    const defaultColor = '#62BB47';

    const SiMicrostation: IconType = React.forwardRef<SVGSVGElement, SiMicrostationProps>(function SiMicrostation({title = 'Microstation', color = 'currentColor', size = 24, ...others }, ref) {
      if (color === 'default') {
        color = defaultColor;
      }

      return (
        <svg
          xmlns='http://www.w3.org/2000/svg'
          width={size}
          height={size}
          fill={color}
          viewBox='0 0 24 24'
          ref={ref}
          {...others}
        >
          <title>{title}</title>
          <path d='M24 .357c-.938.217-3.086.22-3.631 1.15l-.55.922c-1.376 2.348-4.833 11.069-8.183 11.181-3.35.113 1.762-10.712 2.27-11.797-2.08.489-4.078.193-4.826 2.326-.775 2.212-1.54 4.425-2.363 6.62-1.71 4.532-3.795 8.89-6.634 12.767.064-.086.127-.171-.083.117 2.111-.422 4.03-.352 5.295-2.253 1.17-1.759 1.92-3.73 2.712-5.68l.377-.927.303.286c3.017 2.844 5.334 0 7.697-2.219l.349-.327 1.322 4.977 2.932-3.144a33.47 33.47 0 0 1-.713-1.342l-.037-.08C18.302 8.742 21.6 3.935 23.861.566Z' />
        </svg>
      );
    });

    export { SiMicrostation as default, defaultColor };
  