export const createSetupError = () => {
  return new Error(`
 ██████╗ ██████╗ ███╗   ███╗██████╗ ██╗██╗     ███████╗██████╗
██╔════╝██╔═══██╗████╗ ████║██╔══██╗██║██║     ██╔════╝██╔══██╗
██║     ██║   ██║██╔████╔██║██████╔╝██║██║     █████╗  ██║  ██║
██║     ██║   ██║██║╚██╔╝██║██╔═══╝ ██║██║     ██╔══╝  ██║  ██║
╚██████╗╚██████╔╝██║ ╚═╝ ██║██║     ██║███████╗███████╗██████╔╝
  ╚═════╝ ╚═════╝ ╚═╝     ╚═╝╚═╝     ╚═╝╚══════╝╚══════╝╚═════╝

  @compiled/css-in-js

  Runtime code was executed when it shouldn't have. This could have happened because:

  1. You haven't configured a transformer yet. Visit https://compiledcssinjs.com/docs and follow the instructions.
  2. You have duplicate versions of React and hooks are blowing up. You need to de-duplicate your dependencies.

  Good luck!
`);
};
