// eslint-disable-next-line @typescript-eslint/ban-ts-comment
//@ts-nocheck
import type { VariantProps } from 'class-variance-authority'
import * as React from 'react'
import type { SVGProps } from 'react'
import { iconVariants } from '../../iconVariants'

type Color = VariantProps<typeof iconVariants>['color'] | undefined

export const SvgBluetoothDisabled = ({
  color,
  className,
  ...props
}: SVGProps<SVGSVGElement> & {
  color?: Color
}) =>
  React.cloneElement(
    <svg
      width={16}
      height={16}
      viewBox="0 0 18 18"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
      {...props}
    >
      <path
        d="M1.47021 1.47334L16.5302 16.5333M4.6167 11.8112L7.30784 10.0171M8.8335 11.8112V14.9919L12.3596 12.3867M8.96356 8.91333L13.0503 6.1888L8.8335 3.00814V8.79746"
        stroke="currentColor"
        vectorEffect="non-scaling-stroke"
      />
    </svg>,
    {
      className: iconVariants({
        color,
        className,
      }),
      ...props,
    },
  )
