// eslint-disable-next-line @typescript-eslint/ban-ts-comment
//@ts-nocheck
import type { VariantProps } from 'class-variance-authority'
import * as React from 'react'
import type { SVGProps } from 'react'
import { iconVariants } from '../../iconVariants'

type Color = VariantProps<typeof iconVariants>['color'] | undefined

export const SvgNumberZeroSquare = ({
  color,
  className,
  ...props
}: SVGProps<SVGSVGElement> & {
  color?: Color
}) =>
  React.cloneElement(
    <svg
      width={16}
      height={16}
      viewBox="0 0 16 16"
      fill="none"
      xmlns="http://www.w3.org/2000/svg"
      {...props}
    >
      <path
        d="M1.33325 14.6666L1.33326 1.33325H14.6666V14.6666H1.33325Z"
        stroke="currentColor"
        vectorEffect="non-scaling-stroke"
      />
      <path
        d="M5.77856 6.28752V9.71259C5.77856 10.6073 6.50385 11.3325 7.39852 11.3325H8.60192C9.49659 11.3325 10.2219 10.6073 10.2219 9.71259V6.28751C10.2219 5.39284 9.49659 4.66756 8.60192 4.66756H7.39852C6.50385 4.66756 5.77856 5.39284 5.77856 6.28752Z"
        stroke="currentColor"
        vectorEffect="non-scaling-stroke"
      />
    </svg>,
    {
      className: iconVariants({
        color,
        className,
      }),
      ...props,
    },
  )
