<template>
  <section class="m-auto">
    <p>You do not currently have access to this system. If you are an employee in the admissions
    office, please contact your supervisor.</p>
    <p class="mt-3">
    You may have an expired session. Try <a href="/login">Logging in</a> again.
    </p>
  </section>
</template>
<script>
  export default {
    name: 'NoAuth'
  }
</script>
