import * as React from 'react';
import { Col, Icon, InputNumber, Row } from '@btri-ui/base';

const MicroAdjust = () => {
  return (
    <>
      <Row autoMode={true}>
        <Col span={2}>
          <InputNumber
            placeholder="1~2048"
            min={0}
            max={2048}
            controlsType="horizontal"
            defaultValue={0}
            onChange={e => console.log(e)}
          ></InputNumber>
        </Col>
      </Row>
    </>
  );
};

export default MicroAdjust;
