export default {
  name: "Prose",
  acceptsChildren: false,
  category: "Basic",
  props: [
    {
      label: "Content",
      name: "wysiwyg",
      required: true,
      type: { kind: "wysiwyg" },
      default: "",
      placeholder: "enter some content",
      help: "The content to display",
    },
  ],
  defaultStyles: {
    "": {
      "font-family": "var(--theme-fonts-body)",
      "background-color": "transparent",
      "border-left-style": "none",
      "border-left-width": "0px",
      "border-left-color": "var(--theme-border-default)",
      "border-top-style": "none",
      "border-top-width": "0px",
      "border-top-color": "var(--theme-border-default)",
      "border-right-style": "none",
      "border-right-width": "0px",
      "border-right-color": "var(--theme-border-default)",
      "border-bottom-style": "none",
      "border-bottom-width": "0px",
      "border-bottom-color": "var(--theme-border-default)",
      "border-radius": "var(--theme-radii-none)",
      "box-shadow": "var(--theme-shadows-none)",
      "font-size": "var(--theme-fontSizes-md)",
      width: "var(--theme-sizes-full)",
      height: "auto",
      "min-width": "auto",
      "min-height": "auto",
      "max-width": "100%",
      "max-height": "100%",
      "justify-content": "flex-start",
      "align-items": "flex-start",
      "padding-left": "var(--theme-sizes-zero)",
      "padding-right": "var(--theme-sizes-zero)",
      "padding-top": "var(--theme-sizes-zero)",
      "padding-bottom": "var(--theme-sizes-zero)",
      "margin-left": "var(--theme-sizes-zero)",
      "margin-right": "var(--theme-sizes-zero)",
      "margin-top": "var(--theme-sizes-zero)",
      "margin-bottom": "var(--theme-sizes-zero)",
    },
  },
  sources: [],
} as const;
