/*
 * Copyright 2024 Palantir Technologies, Inc. All rights reserved.
 * Licensed under the Apache License, Version 2.0 (the "License");
 * you may not use this file except in compliance with the License.
 * You may obtain a copy of the License at
 *
 *     http://www.apache.org/licenses/LICENSE-2.0
 *
 * Unless required by applicable law or agreed to in writing, software
 * distributed under the License is distributed on an "AS IS" BASIS,
 * WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
 * See the License for the specific language governing permissions and
 * limitations under the License.
 */

import * as React from "react";
import type { SVGIconProps } from "../../svgIconProps";
import { IconSize } from "../../iconTypes";
import { SVGIconContainer } from "../../svgIconContainer";

/** Path data for the 16px grid; matches {@link generate-icon-paths.mjs} / `<Icon />` from core. */
const PATHS_16 = ["M8 0a1 1 0 0 0-1 1v1H3v-.5a.5.5 0 0 0-1 0V2a1 1 0 0 0 0 2v1h-.5a.5.5 0 0 0 0 1h2a.5.5 0 0 0 0-1H3V4h4v11a1 1 0 1 0 2 0V4h4v1h-.5a.5.5 0 0 0 0 1h2a.5.5 0 0 0 0-1H14V4a1 1 0 1 0 0-2v-.5a.5.5 0 0 0-1 0V2H9V1a1 1 0 0 0-1-1"] as readonly string[];

/** Path data for the 20px grid; matches {@link generate-icon-paths.mjs} / `<Icon />` from core. */
const PATHS_20 = ["M10 0a1 1 0 0 0-1 1v2H5V2a1 1 0 0 0-2 0v1H2a1 1 0 0 0 0 2h1v2H2a1 1 0 0 0 0 2h4a1 1 0 0 0 0-2H5V5h4v14a1 1 0 1 0 2 0V5h4v2h-1a1 1 0 1 0 0 2h4a1 1 0 1 0 0-2h-1V5h1a1 1 0 1 0 0-2h-1V2a1 1 0 1 0-2 0v1h-4V1a1 1 0 0 0-1-1"] as readonly string[];

export const LowVoltagePole: React.FC<SVGIconProps> = React.forwardRef<any, SVGIconProps>((props, ref) => {
    const isLarge = (props.size ?? IconSize.STANDARD) >= IconSize.LARGE;
    const paths = isLarge ? PATHS_20 : PATHS_16;
    return (
        <SVGIconContainer iconName="low-voltage-pole" ref={ref} {...props}>
            {paths.map((d, i) => (
                <path key={i} d={d} fillRule="evenodd" />
            ))}
        </SVGIconContainer>
    );
});
LowVoltagePole.displayName = `Blueprint6.Icon.LowVoltagePole`;
export default LowVoltagePole;
