<template>
  <path
    d="M11.5 1.5C5.98 1.5 1.5 5.98 1.5 11.5C1.5 17.02 5.98 21.5 11.5 21.5C17.02 21.5 21.5 17.02 21.5 11.5C21.5 5.98 17.02 1.5 11.5 1.5ZM15.11 7.84C16.18 7.84 17.04 8.7 17.04 9.77C17.04 10.84 16.18 11.7 15.11 11.7C14.04 11.7 13.18 10.84 13.18 9.77C13.17 8.7 14.04 7.84 15.11 7.84ZM9.11 6.26C10.41 6.26 11.47 7.32 11.47 8.62C11.47 9.92 10.41 10.98 9.11 10.98C7.81 10.98 6.75 9.92 6.75 8.62C6.75 7.31 7.8 6.26 9.11 6.26ZM9.11 15.39V19.14C6.71 18.39 4.81 16.54 3.97 14.18C5.02 13.06 7.64 12.49 9.11 12.49C9.64 12.49 10.31 12.57 11.01 12.71C9.37 13.58 9.11 14.73 9.11 15.39ZM11.5 19.5C11.23 19.5 10.97 19.49 10.71 19.46V15.39C10.71 13.97 13.65 13.26 15.11 13.26C16.18 13.26 18.03 13.65 18.95 14.41C17.78 17.38 14.89 19.5 11.5 19.5Z"
  />
</template>
